\begin{table}%t9
%\centering
\par
\caption{Integrated fluxes of M~82 measured by \pronaos and DIRBE in Jy. 
The flux convention is $\nu \times I_{\nu} = \rm cste.$ in both cases.}
\label{tab_Pronaos_Dirbe}
\begin{tabular}{lcc}
\hline
\hline
$\lambda$ & fluxes & Instrument\\
~[$\mic$] & [Jy ] \\
\hline
60   & 1755~$\pm$~29 & \dirbe \\
100  & 2378~$\pm$~160 &  \dirbe \\
140  & 724~$\pm$~160 & \dirbe \\
200  & 643~$\pm$~21  &  \pronaos \\
240  & 410~$\pm$~91  & \dirbe \\
260  & 311~$\pm$~18  & \pronaos \\
360  & 115~$\pm$~2.7 &  \pronaos \\
580  & 20.5~$\pm$~1.4 & \pronaos \\
\hline
\end{tabular} 
\end{table}