\begin{table}%t8
\caption{Measured velocity shift and line width of 
         HILs and LILs.\label{table:08}}
%\centerline
{\begin{tabular}{c c c c c c c}
\hline\hline
 Redshift &
 Magnitude &
 Line &
 Velocity Shift &
 \multicolumn{2}{c}{Profile Parameter} &
 ${\it FWHM}^{{a}}$ \\
  &
  &
  &
 (km~s$^{-1}$) &
 $\alpha$ &
 $\beta$ &
 (km~s$^{-1}$) \\
\hline
$2.0 \! \leq \! z \! < \! 2.5$
  & $-24.5 \! > \! M_B \! \geq \! -25.5$ &
      HIL & --464.9  $\pm$ 1.2  & 
              117.30 $\pm$ 0.02 &
               99.37 $\pm$ 0.02 & 3858 \\
  & & LIL &  --83.4  $\pm$ 1.9  &
              114.49 $\pm$ 0.05 &
              119.60 $\pm$ 0.07 & 3550 \\
  & $-25.5 \! > \! M_B \! \geq \! -26.5$ &
      HIL & --495.6  $\pm$ 1.4  &
              112.90 $\pm$ 0.02 &
               85.50 $\pm$ 0.02 & 4264 \\
  & & LIL &  +111.5  $\pm$ 2.5  &
              106.01 $\pm$ 0.05 &
              110.53 $\pm$ 0.07 & 3838 \\
  & $-26.5 \! > \! M_B \! \geq \! -27.5$ &
      HIL & --446.5  $\pm$ 1.7  &
              110.31 $\pm$ 0.02 &
               79.98 $\pm$ 0.03 & 4474 \\
  & & LIL &  +308.1  $\pm$ 2.5  &
              106.49 $\pm$ 0.07 &
              109.75 $\pm$ 0.09 & 3842 \\
  & $-27.5 \! > \! M_B \! \geq \! -28.5$ &
      HIL & --327.0  $\pm$ 1.8  &
              114.32 $\pm$ 0.02 &
               77.77 $\pm$ 0.02 & 4480 \\
  & & LIL &  +484.8  $\pm$ 2.8  &
              101.64 $\pm$ 0.07 &
              104.12 $\pm$ 0.08 & 4038 \\
  & $-28.5 \! > \! M_B \! \geq \! -29.5$ &
      HIL & --583.7  $\pm$ 2.0  &
              106.74 $\pm$ 0.02 &
               80.08 $\pm$ 0.03 & 4535 \\
  & & LIL &  +153.3  $\pm$ 2.4  &
               93.17 $\pm$ 0.05 &
              105.50 $\pm$ 0.05 & 4199 \\
$2.5 \! \leq \! z \! < \! 3.0$
  & $-24.5 \! > \! M_B \! \geq \! -25.5$ &
      HIL & --390.6  $\pm$ 1.0  &
              128.57 $\pm$ 0.02 &
              117.31 $\pm$ 0.03 & 3384 \\
  & & LIL & --170.7  $\pm$ 1.5  &
              115.80 $\pm$ 0.04 &
              125.72 $\pm$ 0.06 & 3445 \\
  & $-25.5 \! > \! M_B \! \geq \! -26.5$ &
      HIL & --354.7  $\pm$ 1.2  &
              127.48 $\pm$ 0.02 &
              106.94 $\pm$ 0.03 & 3568 \\
  & & LIL &    +4.6  $\pm$ 2.0  &
              125.05 $\pm$ 0.06 & 
              116.90 $\pm$ 0.05 & 3436 \\
  & $-26.5 \! > \! M_B \! \geq \! -27.5$ &
      HIL & --371.4  $\pm$ 1.8  & 
              112.18 $\pm$ 0.01 &
               82.69 $\pm$ 0.02 & 4358 \\
  & & LIL &  +259.9  $\pm$ 2.9  &
              101.31 $\pm$ 0.05 &
              103.77 $\pm$ 0.09 & 4051 \\
  & $-27.5 \! > \! M_B \! \geq \! -28.5$ &
      HIL & --451.1  $\pm$ 1.9  &
              109.93 $\pm$ 0.02 &
               74.99 $\pm$ 0.03 & 4653 \\
  & & LIL &  +571.5  $\pm$ 2.4  &
              109.82 $\pm$ 0.07 &
              102.59 $\pm$ 0.07 & 3914 \\
  & $-28.5 \! > \! M_B \! \geq \! -29.5$ &
      HIL & --535.5  $\pm$ 2.2  &
              108.21 $\pm$ 0.03 &
               73.18 $\pm$ 0.03 & 4751 \\
  & & LIL &  +737.3  $\pm$ 1.7  &
              104.08 $\pm$ 0.05 &
               95.22 $\pm$ 0.05 & 4175 \\
$3.0 \! \leq \! z \! < \! 3.5$
  & $-25.5 \! > \! M_B \! \geq \! -26.5$ &
      HIL & --507.0  $\pm$ 1.2  &
              122.96 $\pm$ 0.02 &
               98.43 $\pm$ 0.03 & 3795 \\
  & & LIL & --186.5  $\pm$ 2.1  &
              119.09 $\pm$ 0.05 &
              111.70 $\pm$ 0.06 & 3602 \\
  & $-26.5 \! > \! M_B \! \geq \! -27.5$ &
      HIL & --576.9  $\pm$ 1.6  &
              119.72 $\pm$ 0.02 &
               89.27 $\pm$ 0.02 & 4056 \\
  & & LIL &  --20.1  $\pm$ 2.2  &
              106.02 $\pm$ 0.05 &
              119.36 $\pm$ 0.06 & 3699 \\
  & $-27.5 \! > \! M_B \! \geq \! -28.5$ &
      HIL & --549.8  $\pm$ 1.8  &
              118.15 $\pm$ 0.03 &
               74.78 $\pm$ 0.02 & 4528 \\
  & & LIL &   +16.9  $\pm$ 2.7  &
              110.84 $\pm$ 0.05 &
              102.22 $\pm$ 0.06 & 3904 \\
  & $-28.5 \! > \! M_B \! \geq \! -29.5$ &
      HIL & --298.9  $\pm$ 1.7  &
              126.01 $\pm$ 0.02 &
               80.60 $\pm$ 0.03 & 4218 \\
  & & LIL &  +763.3  $\pm$ 2.1  &
              110.34 $\pm$ 0.06 &
              103.28 $\pm$ 0.06 & 3891 \\
$3.5 \! \leq \! z \! < \! 4.0$
  & $-25.5 \! > \! M_B \! \geq \! -26.5$ &
      HIL & --644.7  $\pm$ 1.1  &
              126.18 $\pm$ 0.02 &
              110.47 $\pm$ 0.02 & 3524 \\
  & & LIL & --350.6  $\pm$ 1.5  &
              124.67 $\pm$ 0.04 &
              124.82 $\pm$ 0.07 & 3329 \\
  & $-26.5 \! > \! M_B \! \geq \! -27.5$ &
      HIL & --588.7  $\pm$ 1.8  &
              116.88 $\pm$ 0.02 &
               85.67 $\pm$ 0.02 & 4196 \\
  & & LIL &  +263.9  $\pm$ 2.2  &
              111.61 $\pm$ 0.07 &
              103.73 $\pm$ 0.06 & 3861 \\
  & $-27.5 \! > \! M_B \! \geq \! -28.5$ &
      HIL & --507.8  $\pm$ 1.7  &
              120.30 $\pm$ 0.02 &
               76.28 $\pm$ 0.02 & 4441 \\
  & & LIL &  +433.2  $\pm$ 1.6  &
               99.75 $\pm$ 0.04 &
              114.15 $\pm$ 0.07 & 3902 \\
  & $-28.5 \! > \! M_B \! \geq \! -29.5$ &
      HIL &   --5.3  $\pm$ 2.3  &
              109.58 $\pm$ 0.02 &
               88.25 $\pm$ 0.03 & 4245 \\
  & & LIL &  +553.2  $\pm$ 1.7  &
              116.68 $\pm$ 0.05 &
              115.84 $\pm$ 0.07 & 3572 \\
$4.0 \! \leq \! z \! < \! 4.5$
  & $-25.5 \! > \! M_B \! \geq \! -26.5$ &
      HIL & --625.7  $\pm$ 0.7  &
              133.03 $\pm$ 0.02 &
              137.22 $\pm$ 0.03 & 3073 \\
  & & LIL & --145.0  $\pm$ 2.8  &
               89.42 $\pm$ 0.05 &
               86.79 $\pm$ 0.06 & 4716 \\
  & $-26.5 \! > \! M_B \! \geq \! -27.5$ &
      HIL & --634.4  $\pm$ 1.6  &
              116.43 $\pm$ 0.03 &
               91.71 $\pm$ 0.03 & 4044 \\
  & & LIL &  +169.8  $\pm$ 3.9  &
              123.05 $\pm$ 0.10 &
               76.44 $\pm$ 0.05 & 4397 \\
  & $-27.5 \! > \! M_B \! \geq \! -28.5$ &
      HIL & --262.2  $\pm$ 1.9  &
              115.83 $\pm$ 0.02 &
               78.54 $\pm$ 0.02 & 4431 \\
  & & LIL & --287.4  $\pm$ 5.8  &
              111.97 $\pm$ 0.25 &
               91.26 $\pm$ 0.14 & 4127 \\
\hline
\end{tabular}}
\par
\smallskip
$^{{a}}$
   Instrumental broadening was corrected by assuming
   that the instrumental width of 150 km s$^{-1}$.
\end{table}