\begin{table}%t3
%\centering
\par
\caption{Measured line fluxes; $2.0 \leq z < 2.5$.\label{table:03}}
\begin{tabular}{l c c c c c}
\hline\hline
 Line &
 $-24.5 \! > \! M_B \! \geq \! -25.5$ &
 $-25.5 \! > \! M_B \! \geq \! -26.5$ &
 $-26.5 \! > \! M_B \! \geq \! -27.5$ &
 $-27.5 \! > \! M_B \! \geq \! -28.5$ &
 $-28.5 \! > \! M_B \! \geq \! -29.5$ \\
\hline
N{\sc v}$\lambda$1240 &
  0.506 $\pm$ 0.004 &
  0.717 $\pm$ 0.007 &
  0.887 $\pm$ 0.010 &
  0.983 $\pm$ 0.012 &
  1.144 $\pm$ 0.016 \\
Si{\sc ii}$\lambda$1263 &
  0.089 $\pm$ 0.001 &
  0.126 $\pm$ 0.002 &
  0.140 $\pm$ 0.002 &
  0.176 $\pm$ 0.003 &
  0.222 $\pm$ 0.003 \\
O{\sc i}  Si{\sc ii}$\lambda$1305 &
  0.061 $\pm$ 0.002 &
  0.081 $\pm$ 0.002 &
  0.086 $\pm$ 0.002 &
  0.085 $\pm$ 0.002 &
  0.145 $\pm$ 0.004 \\
C{\sc ii}$\lambda$1335 &
  0.033 $\pm$ 0.002 &
  0.047 $\pm$ 0.001 &
  0.052 $\pm$ 0.001 &
  0.050 $\pm$ 0.002 &
  0.089 $\pm$ 0.004 \\
Si{\sc iv}$\lambda$1397 &
  0.111 $\pm$ 0.002 &
  0.027 $\pm$ 0.003 &
  0.001 $\pm$ 0.016 &
  0.033 $\pm$ 0.003 &
  ---               \\
O{\sc iv}]$\lambda$1402 &
  0.145 $\pm$ 0.008 &
  0.308 $\pm$ 0.008 &
  0.374 $\pm$ 0.019 &
  0.365 $\pm$ 0.010 &
  0.419 $\pm$ 0.008 \\
N{\sc iv}]$\lambda$1486 &
  0.017 $\pm$ 0.000 &
  0.013 $\pm$ 0.000 &
  0.015 $\pm$ 0.000 &
  0.020 $\pm$ 0.000 &
  ---               \\
C{\sc iv}$\lambda$1549 &
  1.000 $\pm$ 0.007 &
  1.000 $\pm$ 0.008 &
  1.000 $\pm$ 0.010 &
  1.000 $\pm$ 0.010 &
  1.000 $\pm$ 0.012 \\
1600{\rm \AA} bump &
  0.112 $\pm$ 0.002 &
  0.106 $\pm$ 0.002 &
  0.098 $\pm$ 0.002 &
  0.097 $\pm$ 0.003 &
  0.060 $\pm$ 0.005 \\
He{\sc ii}$\lambda$1640 &
  0.147 $\pm$ 0.001 &
  0.152 $\pm$ 0.001 &
  0.149 $\pm$ 0.002 &
  0.140 $\pm$ 0.001 &
  0.133 $\pm$ 0.002 \\
O{\sc iii}]$\lambda$1663 &
  0.077 $\pm$ 0.001 &
  0.083 $\pm$ 0.002 &
  0.072 $\pm$ 0.002 &
  0.083 $\pm$ 0.003 &
  0.104 $\pm$ 0.002 \\
Al{\sc ii}$\lambda$1671 &
  0.010 $\pm$ 0.001 &
  0.010 $\pm$ 0.001 &
  0.022 $\pm$ 0.001 &
  0.018 $\pm$ 0.001 &
  ---               \\
Al{\sc iii}$\lambda$1857 &
  0.064 $\pm$ 0.001 &
  0.092 $\pm$ 0.001 &
  0.105 $\pm$ 0.001 &
  0.124 $\pm$ 0.002 &
  0.146 $\pm$ 0.002 \\
Si{\sc iii}]$\lambda$1892 &
  0.093 $\pm$ 0.001 &
  0.118 $\pm$ 0.001 &
  0.127 $\pm$ 0.001 &
  0.129 $\pm$ 0.002 &
  0.110 $\pm$ 0.002 \\
C{\sc iii}]$\lambda$1909 &
  0.285 $\pm$ 0.005 &
  0.326 $\pm$ 0.008 &
  0.326 $\pm$ 0.008 &
  0.348 $\pm$ 0.010 &
  0.395 $\pm$ 0.012 \\
\hline
\end{tabular}
\end{table}