\begin{table}%t3
 \caption{Nominal noise standard deviations in the six channels of the Planck HFI.}\label{NoiseScale}
%\centering
\par
    \begin{tabular}{@{} cccccc|c @{}}
    \hline \hline
      100&143&217&353&545&857&channel \\
     \hline
       $ 2.65 \times 10^{-6}$&$2.33 \times 10^{-6}$&$3.44 \times 10^{-6}$&$1.05 \times 10^{-5}$&$1.07 \times 10^{-4}$& $4.84 \times 10^{-3}$ &noise std\\
 \hline
      \end{tabular}
 \end{table}