\begin{table}%t2
%\centering
\par
\caption{The calculated abundances relative to Fe, obtained from the EMD analysis of the \cxc\ (quiescence) and \xmm\ (flare). "Flare'' abundances are in fact averaged "quiescence+flare'' components during the 2001 flare observed by \xmm. Uncertainties are 1$\sigma$. \label{tab:table1} }
\begin{tabular}{c c c c}
\hline \hline
        & Flare & Quiescence & Ratio \\
Element & X/Fe  & X/Fe & Flare/Quies. \\
\hline
\par
N  & 15.1 $\pm$ 2.7  & 13.7 $\pm$ 2.3   & 1.1 $\pm$ 0.3 \\
O  & 30.3 $\pm$ 5    & 42   $\pm$ 6     & 0.72 $\pm$ 0.15 \\
Ne & 15.2 $\pm$ 2.3  & 19.9 $\pm$ 2     & 0.76 $\pm$ 0.14 \\
Mg & 1.94 $\pm$ 0.33 & 1.66  $\pm$ 0.17 & 1.17 $\pm$ 0.23 \\
Si & 0.99 $\pm$ 0.4  & 1.37  $\pm$ 0.14 & 0.72 $\pm$ 0.30 \\
\hline
\end{tabular}
\end{table}