\begin{table}%t1
\caption{Measured line fluxes used for EMD fitting and abundance calculations.\label{tab:fluxtable}}
%\centerline
{
\begin{tabular}{c c c c c}
\hline \hline
Ion & Wavelength & Flare & Quiescence & Ratio \\
    & \AA & $10^{-4}$ photons cm$^{-2}$ s$^{-1}$ & $10^{-4}$ photons cm$^{-2}$ s$^{-1}$ & Flare/Quies.\\
\hline
Fe$^{16+}$ & 15.01   & 6.61 $\pm$  0.7     & 4.85  $\pm$ 0.50  & 1.36 $\pm$ 0.20 \\
Fe$^{17+}$ & 14.20   & 3.98 $\pm$  0.44    & 3.2   $\pm$ 0.33  & 1.25 $\pm$ 0.19 \\
Fe$^{18+}$ & 13.50   & 4.08 $\pm$  0.61    & 3.1   $\pm$ 0.32  & 1.32 $\pm$ 0.24 \\
Fe$^{19+}$ & 12.83   & 4.98 $\pm$  0.59    & 3.08  $\pm$ 0.32  & 1.62 $\pm$ 0.26 \\
Fe$^{20+}$ & 12.28   & 3.64 $\pm$  0.53    & 3.14  $\pm$ 0.33  & 1.16 $\pm$ 0.21 \\
Fe$^{21+}$ & 11.77   & 2.89 $\pm$  0.52    & 2.18  $\pm$ 0.23  & 1.33 $\pm$ 0.28 \\
Fe$^{22+}$ & 11.00   & 3.19 $\pm$  0.6     & 1.40  $\pm$ 0.15  & 2.29 $\pm$ 0.49 \\
Fe$^{23+}$ & 10.64   & 4.74 $\pm$  0.63    & 1.18  $\pm$ 0.13  & 4.02 $\pm$ 0.69 \\
Fe$^{24+}$ & 1.85    & 2.38 $\pm$  0.3*    & 0.136 $\pm$ 0.08  & 17.6 $\pm$ 10.5 \\
Fe$^{25+}$ & 1.78    & 0.51 $\pm$  0.16*   & ...               & ...             \\ 
N$^{6+}$   & 24.78   & 6.66 $\pm$  0.75**  & 3.54  $\pm$ 0.46**& 1.88 $\pm$ 0.32 \\
O$^{6+}$   & 21.60   & 2.37 $\pm$  0.37    & ...               & ...             \\
O$^{7+}$   & 18.97   & 21.8 $\pm$  2.2     & 17.4  $\pm$ 1.8** & 1.25 $\pm$ 0.18 \\
Ne$^{8+}$  & 13.45   & 3.55 $\pm$  0.75    & 3.53  $\pm$ 0.37  & 1.01 $\pm$ 0.24 \\
Ne$^{9+}$  & 12.13   & 22.1 $\pm$  2.3     & 16.0  $\pm$ 1.6   & 1.39 $\pm$ 0.20 \\
Mg$^{10+}$ & 9.17    & 0.94 $\pm$  0.27    & 0.88  $\pm$ 0.10  & 1.07 $\pm$ 0.33 \\
Mg$^{11+}$ & 8.42    & 4.82 $\pm$  0.66    & 1.56  $\pm$ 0.16  & 3.08 $\pm$ 0.53 \\
Si$^{12+}$ & 6.65    & 1.41 $\pm$  0.41    & 1.14  $\pm$ 0.12  & 1.24 $\pm$ 0.38 \\
Si$^{13+}$ & 6.18    & 1.37 $\pm$  0.7     & 1.12  $\pm$ 0.12  & 1.23 $\pm$ 0.64 \\
S$^{14+}$  & 5.05    & ...                 & 0.54  $\pm$ 0.07  & ...             \\
S$^{15+}$  & 4.73    & ...                 & 0.30  $\pm$ 0.05  & ...             \\
Ar$^{16+}$ & 3.96    & ...                 & 0.27  $\pm$ 0.04  & ...             \\
Ar$^{17+}$ & 3.73    & ...                 & 0.036 $\pm$ 0.03  & ...             \\
\hline
\end{tabular}}
\begin{enumerate}
\item[*]{Extracted from EPIC-pn.}
\item[**]{Used for abundances only.}
\end{enumerate}
%\begin{tabular}
Note: For He-like ions, the line flux includes the resonant line only. For H-like ions the flux includes both lines of the Ly$\alpha$ doublet. For Fe the flux includes all the transitions of the ion within 0.03 \AA\ of the given wavelength. Flux errors include 10\%\ instrument calibration error. 
%\end{tabular}
\end{table}