\begin{table}%t1
\caption{\label{tab1}Coordinates of objects discussed in the text.}
%\centerline
{
\begin{tabular}{lll}
 \hline\hline
 Object &  \multicolumn{1}{c}{$\alpha_{2000}$} & \multicolumn{1}{c}{$\delta_{2000}$}  \\
  \hline
 Centre of RCW~79  &  13$^{\rm h}$40$^{\rm m}$17$\fs$0 &
$-$61$\degr$44$\arcmin$00$\arcsec$ \\
IRAS~13374$-$6130 & 13$^{\rm h}$40$^{\rm m}$53$\fs$2 & $-$61$\degr$45$\arcmin$47$\arcsec$ \\
 MSX point source  &  13$^{\rm h}$40$^{\rm m}$53$\fs$1 & $-$61$\degr$45$\arcmin$51$\arcsec$ \\
 Centre of the compact \HII~region$^{\footnotesize 1}$  & 13$^{\rm h}$40$^{\rm m}$52$\fs$5&
  $-$61$\degr$45$\arcmin$54$\arcsec$\\
 Maser sources      &  13$^{\rm h}$40$^{\rm m}$57$\fs$6 & $-$61$\degr$45$\arcmin$43$\arcsec$ \\
 \hline
\end{tabular}}
\smallskip
$^{\footnotesize 1}$ Not given in CGPMC. Measured from their Figs.~3
and 5 (about 5\arcsec~accuracy).
\end{table}