\begin{table}%t2
\caption{Cometary bright-rimmed globules$^{a}$.\label{tabla_armen}}
%\centerline
{\begin{tabular}{ccc}
\hline \hline
Number   & $\alpha$(J2000)$^{b}$ & $\delta$(J2000)$^{b}$ \\ \hline
1        & 06 38 04.4      &  +01 30  55 \\
2        & 06 38 06.6      &  +01 30  44 \\
3        & 06 38 10.7      &  +01 31  03 \\
4        & 06 38 11.1      &  +01 30  31 \\
5        & 06 38 11.8      &  +01 31  01 \\
6        & 06 38 12.3      &  +01 31  03 \\
7$^{c}$    & 06 38 12.4    &  +01 31  07 \\
8        & 06 38 13.7     &  +01 32  49 \\ \hline
\end{tabular}}
\par
\smallskip
 $^{a}$ Positions listed correspond approximately to the apex of the bright rims. Uncertainty is $\sim$1$\arcsec$.\\
$^{b}$ Units of right ascension are hours, minutes and seconds. Units of declination are degrees, arcmins and arcsecs.\\
$^{c}$ Corresponds to CN3.
\end{table}