\begin{table}%t1
%\centering
\par
\caption{Properties of the CCD cameras used during WeCAPP at
Wendelstein (We) and Calar Alto (CA) Observatories. Both
CCDs have a pixel size of $24~\mu{\rm m}$.}
\label{tab.ccd}
\begin{tabular}{llcccc}
\hline \hline Site & Campaign & CCD  & Size &
[${\rm arcsec}/{\rm px}$] & Field [${\rm arcmin}^2$]\\ \hline
We & 2000--2003 & TEK \#1      & 1K $\times$ 1K & 0.49 & $8.3   \times 8.3$  \\
CA & 2000--2002 & SITe2b \#17  & 2K $\times$ 2K & 0.50 & $17.2  \times  17.2$  \\ 
\hline
\end{tabular}
\end{table}