\begin{table}%t7
\caption{\label{table8}$\alpha$ and $\beta$ coeff. for transformation into the Lick system.}
%\centerline
{
\begin{tabular}{lcccc}
\hline\hline
\multicolumn{1}{c}{Index}
& \multicolumn{1}{c}{$\alpha$}
& \multicolumn{1}{c}{$\beta$}
& \multicolumn{1}{c}{aver. disp.}
& \multicolumn{1}{c}{unit}
 \\
\hline
CN$_1$           &         1.059  &         0.023  & 0.025   & mag\\
CN$_2$           &         1.035  &         0.030  & 0.023   & mag \\
Ca4227        &         1.317  &         0.408  & 0.396   & \AA \\
G4300         &         1.105  &         0.179 &  0.310  & \AA\\
Fe4383        &         0.963  &         1.169  & 0.772   & \AA \\
ca4455        &         0.451  &         1.844  & 0.341   & \AA \\
Fe4531        &         1.289  &        --0.299  &0.437    & \AA\\
Fe4668        &         0.976  &         0.128  &0.653    & \AA \\
H$\beta$    &         1.064  &        --0.196   &0.166    & \AA \\
Fe5015        &         1.031  &         0.804  & 0.396   & \AA \\
Mg$_1$           &         1.014  &         0.015  &  0.009  & mag \\
Mg$_2$           &         0.998  &         0.020   & 0.012  &  mag \\
Mgb           &         1.014  &         0.417  &  0.241  & \AA \\
Fe5270        &         1.058  &         0.270  & 0.240   & \AA\\
Fe5335        &         0.990  &         0.356  & 0.249   & \AA \\
Fe5406        &         1.005  &         0.282  & 0.151   & \AA \\
Fe5709        &         1.321  &        --0.270  & 0.174   & \AA \\
Fe5782        &         1.167  &        --0.075 &  0.165  & \AA \\
NaD           &          1.003  &         0.027  & 0.245   & \AA \\
TiO$_1$          &          0.997  &         0.004  & 0.006   &  mag\\
TiO$_2$          &          1.003  &        --0.001   &0.008    &   mag \\
H$\delta_{A}$ &         1.136  &        --0.622   &1.087    & \AA \\
H$\gamma_{A}$ &        0.990  &         0.518   & 0.734   & \AA \\
H$\delta_{F}$ &         1.059  &        --0.036   & 0.503   & \AA \\
H$\gamma_{F}$ &         1.011  &         0.458   & 0.745   & \AA \\
\hline
\end{tabular}}
\medskip
The table provides the coefficients $\alpha$ and $\beta$ of the transformation
into the Lick system ($EW_{\rm Lick} = \beta + \alpha \times EW_{\rm our}$)
derived in Paper~I.
\end{table}