\begin{table}%t6
  \caption{\label{data_phot}Photometric data of S~Ori~J053825.4$-$024241.}
  %\begin{center}
{
                \begin{tabular}{lcr}
            	\hline
            	\hline
Filter			& Magnitude             & Source \\		            	\hline
  $B^{{a}}$		& $\sim$20.9		& USNO-B1 \\ 
$R^{{a}}$		& 18.66 $\pm$ 0.05	& B\'ejar et~al. (2004) \\ 
$I$			& 16.82--17.52		& this paper \\ 
$J$			& 14.57--15.04		& this paper \\ 
$H$			& 14.18 $\pm$ 0.06	& this paper \\ 
$K_{\rm s}^{{a}}$ 	& 13.57 $\pm$ 0.03 	& 2MASS \\
           	            	\hline\\[-3mm]
         \end{tabular}}
         \parbox{6cm}{
	$^{{a}}$  A single measurement.}
	%\end{center}
\end{table}