\begin{table}%T4
    	\caption{\label{data_spec_lris}S~Ori~J053825.4$-$024241: Keck data.}    
        %\begin{center}
{
        \begin{tabular}{lccccc}
            	\hline\hline
            	Line				& {\it pEW} (\AA)		& $v_{\rm h}$ (km~s$^{-1}$) \\
            	            	\hline
            	He {\sc i} $\lambda$5875.8	& $-$3.5 $\pm$ 1.0 	& $+$29 $\pm$ 13$^{{a}}$ \\	  
Na {\sc i} $\lambda$5890.0	& $<$$+$0.1		& --  	\\	  
Na {\sc i} $\lambda$5895.9	& $<$$+$0.1		& --  	\\	  
$[$O {\sc i}$]$	$\lambda$6300.3	& $-$2.1 $\pm$ 0.5 	& $+$7 $\pm$ 13$^{{a}}$	\\	  
H$\alpha$ $\lambda$6562.8 	& $-$260 $\pm$ 30 	& $+$23 $\pm$ 13$^{{a}}$ \\	  
$[$N {\sc ii}$]$ $\lambda$6583.5& [$-$0.2, $+$0.2]      & --	\\	  
Li {\sc i} $\lambda$6707.8	& $<$$+$0.3      	& --	\\	  
Ca {\sc i} $\lambda$6717.7	& $+$0.5 $\pm$ 0.1	& $+$32 $\pm$ 13$^{{b}}$ \\
K {\sc i} $\lambda$7699.0	& $+$0.5 $\pm$ 0.1	& $+$32 $\pm$ 13$^{{b}}$ \\
           	            	\hline\\[-2mm]
         \end{tabular}}
          \parbox{7.5cm}{
                    $^{{a}}$ Velocity obtained from the line centroid.\\
                    $^{{b}}$ Velocity obtained from the cross-correlation technique.}
%\end{center}
\end{table}