\begin{table}%t6
\caption{Component structure of the $z_{\rm abs} = 1.892$ DLA system toward Q1210+17.
\label{Q1210-Ntable}}
%\centerline
{\begin{tabular}{l c c c l c}
\hline\hline
Comp. & $z_{\rm abs}$ & $v_{\rm rel}^*$ & $b (\sigma_b)$ & Ion & $\log N (\sigma_{\log N})$ \\
      &               & [km~s$^{-1}$]   & [km s$^{-1}$]  &     &                       
\smallskip
\\ 
\hline
\multicolumn{6}{l}{\hspace{0.3cm} Low- and intermediate-ion transitions} \\
\hline
\\[-0.28cm]
1 & 1.89126 & $-$53 & \phantom{0}3.0{\scriptsize (0.4)} & \ion{Fe}{ii}  & 12.85{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{Si}{ii}  & 13.10{\scriptsize (0.03)} \\
  &         &       &                                   & \ion{Al}{ii}  & 11.93{\scriptsize (0.04)} \\	
  &         &       &                                   & \ion{P}{ii}   & $<12.77$ \\
  &         &       &                                   & \ion{Mg}{ii}  & $>13.74$ \\
2 & 1.89140 & $-$38 & \phantom{0}5.4{\scriptsize (0.2)} & \ion{Fe}{ii}  & 13.55{\scriptsize (0.01)} \\	
  &         &       &                                   & \ion{Si}{ii}  & 13.75{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{Al}{ii}  & 12.41{\scriptsize (0.03)} \\	
  &         &       &                                   & \ion{P}{ii}   & $<13.09$ \\
  &         &       &                                   & \ion{Mg}{ii}  & $>13.58$ \\
3 & 1.89158 & $-$20 & \phantom{0}7.7{\scriptsize (0.8)} & \ion{Fe}{ii}  & 14.19{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{Si}{ii}  & 14.43{\scriptsize (0.06)} \\	
  &         &       &                                   & \ion{Al}{ii}  & $>13.20$ \\	
  &         &       &                                   & \ion{S}{ii}   & 14.09{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{Mn}{ii}  & 11.91{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{Cr}{ii}  & 12.55{\scriptsize (0.05)} \\	
  &         &       &                                   & \ion{N}{i}    & 13.83{\scriptsize (0.06)} \\	
  &         &       &                                   & \ion{Zn}{ii}  & 11.45{\scriptsize (0.17)} \\	
  &         &       &                                   & \ion{Ni}{ii}  & 12.86{\scriptsize (0.08)} \\	
  &         &       &                                   & \ion{P}{ii}   & $<13.27$ \\
  &         &       &                                   & \ion{Mg}{ii}  & $>14.22$ \\
  &         &       &                                   & \ion{Al}{iii} & 12.36{\scriptsize (0.03)} \\
4 & 1.89177 &	  0 & \phantom{0}5.8{\scriptsize (0.1)} & \ion{Fe}{ii}  & 14.84{\scriptsize (0.03)} \\  
  &         &       &                                   & \ion{Si}{ii}  & 15.19{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{Al}{ii}  & $>14.93$ \\	
  &         &       &                                   & \ion{S}{ii}   & 14.81{\scriptsize (0.01)} \\	
  &         &       &                                   & \ion{Mn}{ii}  & 12.57{\scriptsize (0.01)} \\	
  &         &       &                                   & \ion{Cr}{ii}  & 13.11{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{N}{i}    & 14.59{\scriptsize (0.10)} \\	
  &         &       &                                   & \ion{Zn}{ii}  & 12.29{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{Ni}{ii}  & 13.52{\scriptsize (0.05)} \\	
  &         &       &                                   & \ion{Ti}{ii}  & 12.34{\scriptsize (0.08)} \\
  &         &       &                                   & \ion{P}{ii}   & $<13.72$ \\
  &         &       &                                   & \ion{Mg}{ii}  & $<15.51$ \\	
  &         &       &                                   & \ion{Al}{iii} & 12.77{\scriptsize (0.02)} \\
5 & 1.89192 & $+$16 & \phantom{0}7.6{\scriptsize (0.1)} & \ion{Fe}{ii}  & 14.13{\scriptsize (0.01)} \\	
  &         &       &                                   & \ion{Si}{ii}  & 14.38{\scriptsize (0.06)} \\	
  &         &       &                                   & \ion{Al}{ii}  & $>12.76$ \\	
  &         &       &                                   & \ion{S}{ii}   & 14.13{\scriptsize (0.05)} \\	
  &         &       &                                   & \ion{Mn}{ii}  & 11.88{\scriptsize (0.02)} \\	
  &         &       &                                   & \ion{Cr}{ii}  & 12.45{\scriptsize (0.07)} \\	
  &         &       &                                   & \ion{N}{i}    & 13.78{\scriptsize (0.10)} \\	
  &         &       &                                   & \ion{Zn}{ii}  & 11.44{\scriptsize (0.17)} \\	
  &         &       &                                   & \ion{Ni}{ii}  & 12.82{\scriptsize (0.08)} \\	
  &         &       &                                   & \ion{Mg}{ii}  & $>14.71$ \\
  &         &       &                                   & \ion{Al}{iii} & 12.17{\scriptsize (0.05)} \\
6 & 1.89222 & $+$47 &           11.7{\scriptsize (0.5)} & \ion{Mg}{ii}  & 12.34{\scriptsize (0.04)} \\
7 & 1.89242 & $+$67 & \phantom{0}4.4{\scriptsize (0.2)} & \ion{Fe}{ii}  & 12.57{\scriptsize (0.01)} \\
  &         &       &                                   & \ion{Si}{ii}  & 12.90{\scriptsize (0.04)} \\	
  &         &       &                                   & \ion{Al}{ii}  & 11.26{\scriptsize (0.10)} \\	
  &         &       &                                   & \ion{Mg}{ii}  & 12.89{\scriptsize (0.01)} \\
\hline
\end{tabular}}
\par
\smallskip
$^*$ Velocity relative to $z=1.89177$. 
\end{table}