\begin{table}%t5
\caption{Component structure of the $z{_{\rm abs}} = 1.944$ DLA system toward Q1157+014.
\label{Q1157-Ntable}}
%\centerline
%$$
%{\begin{tabular}{l c c c l c | l c c c l c}
%\hline\hline
%\\[-0.3cm]
%Comp. & $z_{\rm abs}$ & $v_{\rm rel}^*$ & $b (\sigma_b)$ & Ion & $\log N (\sigma_{\log N})$ & Comp. & $z_{\rm abs}$ & 
%$v_{\rm rel}^*$ & $b (\sigma_b)$ & Ion & $\log N (\sigma_{\log N})$ \\
%      &               & [km s$^{-1}$]   & [km s$^{-1}$]  &     &                            &       &               & 
%[km s$^{-1}$]   & [km s$^{-1}$]  &     &        
%\smallskip
%\\ 
%\hline
%\multicolumn{8}{l}{\hspace{0.3cm} Low- and intermediate-ion transitions} & & & & \\
%\hline
%\\[-0.28cm]
%\kern-5pt\raisebox{0pt}[0pt][0pt]{\framebox{\parbox[t]{0.2cm}{1\\ \\ \\ \\ 2}}}
 % & 1.94305 & $-$73 &           12.2{\scriptsize (0.7)} & \ion{Fe}{ii}  & 13.39{\scriptsize (0.05)} & \kern-5pt\raisebox{0pt}[0pt][0pt]{\framebox{\parbox[b]{0.2cm}{\mbox{} \\ 5}}}
                                                                                                      %  & 1.94377 &	0 & \phantom{0}5.7{\scriptsize (0.2)} & \ion{Fe}{ii}  & 14.47{\scriptsize (0.03)} \\
 % &         &       &                                   & \ion{Si}{ii}  & 13.60{\scriptsize (0.01)} &   &	  &	  &				      & \ion{Si}{ii}  & 15.27{\scriptsize (0.02)} \\
%  &         &       &                                   & \ion{Al}{ii}  & $>12.05$                  &   &	  &	  &				      & \ion{Al}{ii}  & $>14.81$ \\
%  &         &       &                                   & \ion{Mg}{i}   & 11.69{\scriptsize (0.02)} &   &	  &	  &				      & \ion{P}{ii}   & 12.76{\scriptsize (0.10)} \\
%2 
 % & 1.94316 & $-$62 & \phantom{0}5.9{\scriptsize (0.4)} & \ion{Fe}{ii}  & 14.00{\scriptsize (0.10)} &   &	  &	  &				      & \ion{Mn}{ii}  & 11.98{\scriptsize (0.06)} \\
%  &         &       &                                   & \ion{Si}{ii}  & 14.52{\scriptsize (0.03)} &   &	  &	  &				      & \ion{Cr}{ii}  & 12.82{\scriptsize (0.03)} \\
 % &         &       &                                   & \ion{Al}{ii}  & $>12.48$                  &   &	  &	  &				      & \ion{N}{i}    & $>14.39$ \\
 % &         &       &                                   & \ion{P}{ii}   & 13.02{\scriptsize (0.14)} &   &	  &	  &				      & \ion{Zn}{ii}  & 12.38{\scriptsize (0.06)} \\
%  &         &       &                                   & \ion{Mn}{ii}  & 11.93{\scriptsize (0.04)} &   &	  &	  &				      & \ion{Ni}{ii}  & 13.22{\scriptsize (0.04)} \\
 % &         &       &                                   & \ion{Cr}{ii}  & 12.32{\scriptsize (0.03)} &   &	  &	  &				      & \ion{Mg}{ii}  & 15.34{\scriptsize (0.03)} \\
 % &         &       &                                   & \ion{N}{i}    & 13.84{\scriptsize (0.03)} &   &	  &	  &				      & \ion{Ti}{ii}  & 12.11{\scriptsize (0.07)} \\
 % &         &       &                                   & \ion{Ni}{ii}  & 12.80{\scriptsize (0.03)} &   &	  &	  &				      & \ion{Co}{ii}  & 11.43{\scriptsize (0.25)} \\
 % &         &       &                                   & \ion{Mg}{ii}  & 14.52{\scriptsize (0.12)} &   &	  &	  &				      & \ion{Mg}{i}   & 12.03{\scriptsize (0.04)} \\
 % &         &       &                                   & \ion{Ti}{ii}  & 11.30{\scriptsize (0.23)} &   &	  &	  &				    & \ion{C}{ii}$^*$ & 14.95{\scriptsize (0.12)} \\
 % &         &       &                                   & \ion{Co}{ii}  & 11.85{\scriptsize (0.24)} &   &	  &	  &				      & \ion{C}{i}    & $<12.07$ \\ 
 % &         &       &                                   & \ion{Mg}{i}   & 11.76{\scriptsize (0.02)} &   &	  &	  &				      & \ion{Ge}{ii}  & 10.73{\scriptsize (0.27)} \\
  %&         &       &                                 & \ion{C}{ii}$^*$ & 12.78{\scriptsize (0.05)} &   &	  &	  &				      & \ion{Al}{iii} & 12.28{\scriptsize (0.03)} \\
 % &         &       &                                   & \ion{Al}{iii} & 11.63{\scriptsize (0.05)} &   &	  &	  &				      & \ion{Fe}{iii} & $<13.97$ \\
 % &         &       &                                   & \ion{Fe}{iii} & $<13.29$                  & \kern-5pt\raisebox{0pt}[0pt][0pt]{\framebox{\parbox[t]{0.2cm}{6\\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ 7}}}
                                                                                                      %  & 1.94404 & $+$27 & \phantom{0}6.3{\scriptsize (0.2)} & \ion{Fe}{ii}  & 14.66{\scriptsize (0.01)} \\
%3 & 1.94346 & $-$32 & \phantom{0}6.3{\scriptsize (0.4)} & \ion{Fe}{ii}  & 14.40{\scriptsize (0.04)} &   &	  &	  &				      & \ion{Si}{ii}  & 15.19{\scriptsize (0.01)} \\
%  &         &       &                                   & \ion{Si}{ii}  & 14.90{\scriptsize (0.02)} &   &	  &	  &				      & \ion{Al}{ii}  & $>9.00$ \\		    
 % &         &       &                                   & \ion{Al}{ii}  & $>9.01$                   &   &	  &	  &				      & \ion{P}{ii}   & 12.95{\scriptsize (0.09)} \\
%  &         &       &                                   & \ion{P}{ii}   & 12.65{\scriptsize (0.11)} &   &	  &	  &				      & \ion{Mn}{ii}  & 12.55{\scriptsize (0.01)} \\
 % &         &       &                                   & \ion{Mn}{ii}  & 12.36{\scriptsize (0.03)} &   &	  &	  &				      & \ion{Cr}{ii}  & 12.98{\scriptsize (0.02)} \\
 % &         &       &                                   & \ion{Cr}{ii}  & 12.71{\scriptsize (0.04)} &   &	  &	  &				      & \ion{N}{i}    & $>14.87$ \\		    
 % &         &       &                                   & \ion{N}{i}    & $>14.27$                  &   &	  &	  &				      & \ion{Zn}{ii}  & 12.22{\scriptsize (0.05)} \\
 % &         &       &                                   & \ion{Zn}{ii}  & 11.63{\scriptsize (0.06)} &   &	  &	  &				      & \ion{Ni}{ii}  & 13.36{\scriptsize (0.02)} \\
 % &         &       &                                   & \ion{Ni}{ii}  & 13.19{\scriptsize (0.02)} &   &	  &	  &				      & \ion{Mg}{ii}  & 15.20{\scriptsize (0.03)} \\
 % &         &       &                                   & \ion{Mg}{ii}  & 14.95{\scriptsize (0.06)} &   &	  &	  &				      & \ion{Ti}{ii}  & 11.76{\scriptsize (0.20)} \\
 % &         &       &                                   & \ion{Ti}{ii}  & 12.07{\scriptsize (0.07)} &   &	  &	  &				      & \ion{Co}{ii}  & 12.46{\scriptsize (0.16)} \\
 % &         &       &                                   & \ion{Co}{ii}  & 12.24{\scriptsize (0.18)} &   &	  &	  &				      & \ion{Mg}{i}   & 11.50{\scriptsize (0.04)} \\
 % &         &       &                                   & \ion{Mg}{i}   & 11.92{\scriptsize (0.03)} &   &	  &	  &				    & \ion{C}{ii}$^*$ & 13.80{\scriptsize (0.04)} \\
 % &         &       &                                 & \ion{C}{ii}$^*$ & 13.70{\scriptsize (0.04)} &   &	  &	  &				      & \ion{Ge}{ii}  & 11.51{\scriptsize (0.12)} \\
 % &         &       &                                   & \ion{Ge}{ii}  & 10.88{\scriptsize (0.18)} &   &	  &	  &				      & \ion{Al}{iii} & 12.00{\scriptsize (0.03)} \\
 % &         &       &                                   & \ion{Al}{iii} & 12.24{\scriptsize (0.03)} &   &	  &	  &				      & \ion{Fe}{iii} & $<12.31$ \\
 % &         &       &                                   & \ion{Fe}{iii} & $<13.76$                  & %7 
                                                                                                        %& 1.94411 & $+$35 &	      24.0{\scriptsize (1.3)} & \ion{Fe}{ii}  & 13.54{\scriptsize (0.06)} \\
%\kern-5pt\raisebox{0pt}[0pt][0pt]{\framebox{\parbox[t]{0.2cm}{4\\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\ \\}}}
 % & 1.94366 & $-$11 &           28.8{\scriptsize (0.4)} & \ion{Fe}{ii}  & 15.24{\scriptsize (0.01)} &   &	  &	  &				 %     & \ion{Si}{ii}  & 14.16{\scriptsize (0.06)} \\
 % &         &       &                                   & \ion{Si}{ii}  & 15.67{\scriptsize (0.01)} &   &	  &	  &				      & \ion{Al}{ii}  & $>12.54$ \\		    
 % &         &       &                                   & \ion{Al}{ii}  & $>14.56$                  &   &	  &	  &				      & \ion{Mg}{i}   & 12.10{\scriptsize (0.02)} \\
 % &         &       &                                   & \ion{P}{ii}   & 13.64{\scriptsize (0.08)} &   &	  &	  &				    & \ion{C}{ii}$^*$ & 14.05{\scriptsize (0.01)} \\
 % &         &       &                                   & \ion{Mn}{ii}  & 13.01{\scriptsize (0.01)} &   &   &    &    &    & \\
 % &         &       &                                   & \ion{Cr}{ii}  & 13.53{\scriptsize (0.01)} &   &   &	 &    &    & \\
 % &         &       &                                   & \ion{N}{i}    & $>14.86$                  &   &   &	 &    &    & \\
 % &         &       &                                   & \ion{Zn}{ii}  & 12.73{\scriptsize (0.04)} &   &   &	 &    &    & \\
  %&         &       &                                   & \ion{Ni}{ii}  & 14.00{\scriptsize (0.01)} &   &   &	 &    &    & \\
 % &         &       &                                   & \ion{Mg}{ii}  & 15.67{\scriptsize (0.03)} &   &   &	 &    &    & \\
  %&         &       &                                   & \ion{Ti}{ii}  & 12.55{\scriptsize (0.16)} &   &   &	 &    &    & \\
  %&         &       &                                   & \ion{Co}{ii}  & 12.89{\scriptsize (0.10)} &   &   &	 &    &    & \\
  %&         &       &                                   & \ion{Mg}{i}   & 12.65{\scriptsize (0.01)} &   &   &	 &    &    & \\
  %&         &       &                                 & \ion{C}{ii}$^*$ & 14.34{\scriptsize (0.02)} &   &   &	 &    &    & \\
 % &         &       &                                   & \ion{C}{i}    & $<12.10$                  &   &   &	 &    &    & \\
 % &         &       &                                   & \ion{Ge}{ii}  & 11.71{\scriptsize (0.14)} &   &   &	 &    &    & \\
 % &         &       &                                   & \ion{Al}{iii} & 13.02{\scriptsize (0.01)} &   &   &    &    &    & \\
 % &         &       &                                   & \ion{Fe}{iii} & $<14.45$                  &   &   &    &    &    & \\
%\hline
%\end{tabular}}
%$$
%\smallskip
%\hspace*{4mm}$^*$ Velocity relative to $z=1.94377$. 
\includegraphics{tab5.eps}
\end{table}