\begin{table}%t3
\caption{Component structure of the $z_{\rm abs} = 2.375$ DLA system toward Q0841+129.
\label{Q0841-2p375-Ntable}}
%\centerline
%%$$
%{\begin{tabular}{l c c c l c | l c c c l c}
%\hline\hline
%\\[-0.3cm]
%Comp. & $z_{\rm abs}$ & $v_{\rm rel}^*$ & $b (\sigma_b)$ & Ion & $\log N (\sigma_{\log N})$ & Comp. & $z_{\rm abs}$ & 
%$v_{\rm rel}^*$ & $b (\sigma_b)$ & Ion & $\log N (\sigma_{\log N})$ \\
%      &               & [km s$^{-1}$]   & [km s$^{-1}$]  &     &                            &       &               & 
%[km s$^{-1}$]   & [km s$^{-1}$]  &     &        
%\smallskip
%\\ 
%\hline
%\multicolumn{6}{l}{\hspace{0.3cm} Low-ion transitions} & & & & & & \\
%\hline
%\\[-0.28cm]
%\kern-5pt\raisebox{0pt}[0pt][0pt]{\framebox{\parbox[t]{0.2cm}{1\\ \\ \\ \\ 2}}}
%  & 2.37407 & $-$40 & 2.0{\scriptsize (1.0)} & \ion{Fe}{ii} & 11.86{\scriptsize (0.05)} & 4 & 2.37452 &     0 & 8.8{\scriptsize (0.1)} & \ion{Fe}{ii} & 14.69{\scriptsize (0.01)} \\
%  &         &       &                        & \ion{Si}{ii} & 12.67{\scriptsize (0.06)} &   &	      &       & 		       & \ion{Si}{ii} & 15.16{\scriptsize (0.03)} \\
%  &         &       &                        & \ion{Al}{ii} & 11.37{\scriptsize (0.08)} &   &	      &       & 		       & \ion{Al}{ii} & $>13.67$ \\ 
%  &         &       &                        & \ion{O}{i}   & 13.10{\scriptsize (0.05)} &   &	      &       & 		       & \ion{O}{i}   & $>15.76$ \\ 
%%2 
%  & 2.37421 & $-$28 & 5.7{\scriptsize (0.8)} & \ion{Fe}{ii} & 12.39{\scriptsize (0.05)} &   &	      &       & 		       & \ion{S}{ii}  & 14.65{\scriptsize (0.04)} \\
%  &         &       &                        & \ion{Si}{ii} & 13.15{\scriptsize (0.04)} &   &	      &       & 		       & \ion{N}{i}   & 14.57{\scriptsize (0.01)} \\
 % &         &       &                        & \ion{Al}{ii} & 11.81{\scriptsize (0.05)} &   &	      &       & 		       & \ion{Mn}{ii} & 12.42{\scriptsize (0.01)} \\ 
%  &         &       &                        & \ion{O}{i}   & 13.85{\scriptsize (0.05)} &   &	      &       & 		       & \ion{Cr}{ii} & 13.05{\scriptsize (0.01)} \\
%3 & 2.37435 & $-$15 & 6.6{\scriptsize (0.4)} & \ion{Fe}{ii} & 13.81{\scriptsize (0.03)} &   &	      &       & 		       & \ion{Zn}{ii} & 12.10{\scriptsize (0.02)} \\
 % &         &       &                        & \ion{Si}{ii} & 14.04{\scriptsize (0.15)} &   &	      &       & 		       & \ion{Ni}{ii} & 13.45{\scriptsize (0.03)} \\
 % &         &       &                        & \ion{Al}{ii} & $>12.54$                  &   &	      &       & 		       & \ion{Mg}{ii} & 15.13{\scriptsize (0.10)} \\
 % &         &       &                        & \ion{O}{i}   & $>15.55$                  &   &	      &       & 		       & \ion{P}{ii}  & 12.82{\scriptsize (0.06)} \\
 % &         &       &                        & \ion{S}{ii}  & 13.63{\scriptsize (0.15)} &   &	      &       & 		       & \ion{Ar}{i}  & 13.53{\scriptsize (0.08)} \\
 % &         &       &                        & \ion{N}{i}   & 13.49{\scriptsize (0.02)} &   &	      &       & 		    & \ion{C}{ii}$^*$ & 12.96{\scriptsize (0.08)} \\
 % &         &       &                        & \ion{Mn}{ii} & 11.70{\scriptsize (0.07)} &   &	      &       & 		       & \ion{C}{i}   & $<12.89$ \\
 % &         &       &                        & \ion{Cr}{ii} & 11.63{\scriptsize (0.12)} & 5 & 2.37479 & $+$24 & 4.2{\scriptsize (0.1)} & \ion{Fe}{ii} & 13.27{\scriptsize (0.01)} \\
%  &         &       &                        & \ion{Ni}{ii} & 12.74{\scriptsize (0.13)} &   &	      &       & 		       & \ion{Si}{ii} & 13.56{\scriptsize (0.01)} \\
 % &         &       &                        &              &                           &   &	      &       & 		       & \ion{Al}{ii} & 11.98{\scriptsize (0.03)} \\
 % &         &       &                        &              &                           &   &	      &       & 		       & \ion{O}{i}   & $>15.27$ \\
 % &         &       &                        &              &                           & 6 & 2.37493 & $+$36 & 3.0{\scriptsize (1.0)} & \ion{Fe}{ii} & 12.22{\scriptsize (0.08)} \\
 % &         &       &                        &              &                           &   &	      &       & 		       & \ion{Si}{ii} & 12.43{\scriptsize (0.07)} \\
 % &         &       &                        &              &                           &   &	      &       & 		       & \ion{Al}{ii} & 11.31{\scriptsize (0.08)} \\
 % &         &       &                        &              &                           &   &	      &       & 		       & \ion{O}{i}   & 13.47{\scriptsize (0.04)} \\
%\hline
%\multicolumn{6}{l}{\hspace{0.3cm} Intermediate-ion transitions} & & & & & & \\
%\hline
%\\[-0.28cm]
%1 & 2.37435 & $-$15 & 6.6{\scriptsize (0.0)} & \ion{Al}{iii} & 11.82{\scriptsize (0.07)} & 2 & 2.37454 & $+$2  & 11.0{\scriptsize (1.1)} & \ion{Al}{iii} & 12.40{\scriptsize (0.04)} \\ 
 % &         &       &                        & \ion{Fe}{iii} & 13.00{\scriptsize (0.12)} &   &	       &       &       		         & \ion{Fe}{iii} & 13.75{\scriptsize (0.03)} \\ 
%  &         &       &                        & \ion{S}{iii}  & $<13.55$                  &   &	       &       &                         & \ion{S}{iii}  & $<14.04$ \\
%\hline
%\end{tabular}}
%$$
%\smallskip
%\par
%$^*$ Velocity relative to $z=2.37452$. 
\includegraphics{tab3.eps}
\end{table}