\begin{table}%t1
%\centering
\par
\caption{The accuracy of the reduction of planet observations
in the systems of the PPM and Tycho-2 catalogues.}\label{tab1}
%\begin{flushleft}
\begin{tabular}{lcccccccc}
\hline\hline\noalign{\smallskip}
&(O--C)$_{\alpha}^{\rm S}$&(O--C)$_{\alpha}^{\rm S}$&rms$_{\alpha}^{\rm S}$& rms$_{\alpha}^{\rm S}$&(O--C)$_\delta''$&(O--C)$_\delta''$&  rms$_{\delta}''$&rms$_{\delta}''$\\
\hline
Planets&PPM&Tycho-2&PPM&Tycho-2&PPM&Tycho-2&PPM&Tycho-2\\
\hline
Venus &  --0.010  &--0.008 &$\pm0.028$ & $\pm0.015$& 0.09 &0.05& $\pm0.30$&$\pm0.20$ \\
Mars &    0.002 &  0.000 &    0.017 &      0.012&  0.03& 0.02&     0.16&     0.10 \\
Saturn & --0.005  &--0.002 &    0.030 &      0.016&  0.01& 0.00&     0.30&     0.21 \\
Uranus & --0.023  &--0.012 &    0.024 &      0.013&  0.21& 0.15&     0.22&     0.15 \\
Neptune& --0.025  &--0.015 &    0.013 &      0.008&  0.00& 0.00&     0.36&     0.18 \\
Pluto &   0.145  & 0.117 &    0.057 &      0.031& --0.48& --0.48&    0.33&     0.24 \\
\hline
\end{tabular}
%\end{flushleft}
\end{table}