\begin{table}%t6
\par
\caption{Magnitudes  for the GRB~021004 host galaxy. The  values marked
with $^{\star}$ are measured values,  while the rest are predictions obtained 
from the fitted template. The magnitudes are  given in the Vega system and 
are not corrected for Galactic reddening. \label{hostmag}}
%\centerline
{\begin{tabular}{c l}\noalign{\smallskip} 
\hline\hline 
\noalign{\smallskip}
Band&Magnitude\\
\noalign{\smallskip} 
\hline \noalign{\smallskip}
$U$ & 24.49 $\pm$ 0.28\\
$B$ & 24.65 $\pm$ 0.13$^{\star}$\\
$V$ & 24.45 $\pm$ 0.04$^{\star}$\\
$R$ & 24.21 $\pm$ 0.05\\
$I$ & 23.82 $\pm$ 0.17$^{\star}$\\
$J$ & 23.15 $\pm$ 0.38$^{\star}$\\
$H$ & 22.92 $\pm$ 0.31\\
$K$ & 22.42 $\pm$ 0.37\\
\hline
\end{tabular}}

$\star$ Measured values. 
\end{table}