\begin{table}%t2
    \caption{\label{tbl:starcal}Monochromatic flux densities in [Jy] of the stellar calibrators
             at the TIMMI2 central filter wavelengths.
  Note: The key wavelengths were taken from
  {\tt http://www.ls.eso.org/lasilla/sciops/3p6/timmi/Filters}.
  The model fluxes were taken from
  {\tt http://www.iso.vilspa.esa.es\-/users\-/expl\_lib\-/ISO\-/wwwcal\-/isoprep\-/cohen/\-templates/}
  and interpolated to the central filter wavelengths.}
             %\centering
\par
  \begin{tabular}{lllllllll}
  \hline\hline
           & \multicolumn{8}{c}{Filter/Wavelength [$\mu$m]} \\
           \hline
      Star & $N$1    & $N$8.9  & $N$9.8  & $N$10.4 & $N$2    & $N$11.9 & $N$12.9 & $Q$1 \\
           & 8.70  & 8.73  & 9.68  & 10.38 & 10.68 & 11.66 & 12.35 & 17.72 \\
       \hline
     HD~47105  &  9.16 &  9.08 &  7.47 &  6.52 &  6.17 &  5.19 &  4.58 &  2.27 \\
  HD~123139 & 69.97 & 69.51 & 57.37 & 50.09 & 47.61 & 40.08 & 35.59 & 17.63 \\
  HD~196171 & 25.58 & 25.42 & 20.98 & 18.32 & 17.41 & 14.65 & 13.01 &  6.45 \\
       \hline
  \end{tabular}
    \end{table}