\begin{table}%t1
   %\centering
\par
   \caption{Comparison of the principal characteristics of publically
              available libraries of synthetic spectra with resolution
              better than 5~\AA.  {\it N}: number of combinations of
              atmospheric parameters and rotational velocities.  {\it new
              ODF}: use of the new opacity distribution functions.  {\it
              TiO}: inclusion of the TiO line-list. {\it pred. lines}:
              inclusion of the "predicted lines''. The last three columns
              indicate if the spectra are provided for different values of
              enhancement of $\alpha$-elements, micro-turbulence velocity
              and rotational velocity.}
   \includegraphics[width=17.2cm,clip]{2490Tab1.ps}  
   \label{tab1}
  \end{table}