\begin{table}%t6
\caption{\label{Tab:Mass} Masses and mass ratios for the 29 systems 
with main-sequence primaries
passing all consistency tests.}
%\centering
\par
\begin{tabular}{rcccccp{6cm}}
\hline\hline
HIP & $M_1$ (\Msun)  & $M_2$(\Msun) &  $M_2/M_1$ & $Q =
\frac{M_2^3}{(M_1+M_2)^2}$ & Sp. Type & Rem. \\
\hline
1349 & 0.98 & 0.55 & 0.56 & 0.0711 & G2 & \\
1955 & 1.13 & 0.48 & 0.42 & 0.0420 & GO & \\
7078 & 1.21 & 0.70 & 0.58 & 0.0953 & F6 & \\
8903 & 1.86 & 1.05 & 0.56 & 0.1358 & A5 & \\
11231 &1.01 & 0.68 & 0.67 &  0.111 & G2 & \\
\\
12062 & 0.95 & 0.44 & 0.47 & 0.0449 & G5 & \\
20935 & 1.13 & 1.11 & 0.98 & 0.2732 & F7 & not a composite spectrum
despite a mass ratio close to unity\\ 
24419 & 0.90 & 0.21 & 0.24 & 0.0079
& G8 &
\\ 34164 & 1.09 & 0.66 & 0.61 & 0.0954 & G0& \\
39893 & 0.95 & 0.52 & 0.55 & 0.0649 &  G3& \\
\\
47461 & --    & --    & --    & 0.0863 & F2& composite spectrum\\
63406 & 0.82 & 0.23 & 0.28 & 0.0114 & G9& \\
72848 & 0.79 & 0.45 & 0.56 & 0.0581 & K2& \\
73440 & 1.03 & 0.15 & 0.14 & 0.0023 & G0& \\
75379 & 1.26 & 0.68 & 0.54 & 0.0842 & F5 & \\
\\
79101  & 3.47 &  1.31 &  0.38 & 0.0976 & B9 & \\
80346 & 0.50 & 0.13 & 0.26 & 0.0054 &M3 & \\
80686 & 1.05 & 0.37 &  0.36 &  0.0259 & G0 & \\
82860 & 1.18 & 0.52 & 0.44 & 0.0482 & F6 & \\
86400 & 0.72 & 0.39 & 0.54 & 0.0475 & K3& \\
87895 & 0.99 & 0.68 & 0.69 & 0.1129 & G2& \\
\\
89937 & 1.18 & 0.77 & 0.65 & 0.1195 & F7Vvar& \\
95028 & 1.40 & 0.50 &  0.36 & 0.0353 & F5 & \\
95575 & 0.78 & 0.38 & 0.49 & 0.0405 & K3& \\
99965 & 0.88 & 0.56 & 0.63 & 0.0840 & G5& \\
105969 &  1.01 & 0.49 &  0.49 &  0.0528 & Dwarf Ba/Subgiant CH & \\
109176 & 1.25 & 0.80 & 0.64 & 0.1233 & F5 & \\
\\
111170 & 1.08 & 0.70 & 0.65 & 0.1083 & F7 & \\
113718 & 0.76 & 0.18 & 0.24 & 0.0067 & K4 & \\
\hline
\end{tabular}
\end{table}