\begin{table}%t3
%\centering
\par
\caption{Observable quantities predicted from the sets of parameters in Table~\ref{tablepar}.}
\label{tableobs}
\par
\begin{tabular}{cccccccccccccccc}
\hline\hline\noalign{\smallskip}
Model  &  $M$/\msun  & $\chi^2_{{\rm R}i}$ &  $(Z/X)_{\rm s}$ & $\chi^2_{{\rm R}i}$ &  $R$/\rsol  & $\chi^2_{{\rm 
R}i}$ & $T_{\rm eff}$ & $\chi^2_{{\rm R}i}$ & $L$/\lsol  & $\chi^2_{{\rm R}i}$ &  $\Delta\nu$  & $\chi^2_{{\rm 
R}i}$ &  $\delta\nu$ & $\chi^2_{{\rm R}i}$ &$\chi^2_{\rm R}$\\[2mm]
% mfix averaged_sep teff
\hline
\par
A1t     & 1.105  &  & 0.037 &0.06 &  1.234 &  & 5764 &0.17 & 1.508 & 0.04  & 105.7 &0.01 & 4.95& 0.66  & 1.52 \\
B1t    & 0.934  &  & 0.039  &0.00&  0.874 &  & 5280 &0.03 & 0.534 & 0.44  & 161.1 & 0.& 9.22& 0.1  & \\
% mfix averaged_sep radii
\hline
A1r     & 1.105&  & 0.038&0.02  &  1.227& 0.20  & 5770& & 1.498& 0.13   & 106.5 &0.52 & 5.07& 0.53  & 2.80 \\
B1r     & 0.934&  & 0.041&0.00   &  0.872& 0.67  & 5289& & 0.533& 0.48   & 161.6 &0.11 &  9.33&0.14  &\\
% mfix averaged_sep no diff
\hline
A1nd     & 1.105&  &  0.040 & 0.00 & 1.227& 0.17  & 5780 & & 1.508& 0.05  &  106.6& 0.56  &  5.34& 0.27  & 
2.27\\
B1nd     & 0.934&  &  0.040 & 0.00 & 0.872& 0.66  & 5258 & & 0.521& 0.17  &  161.7& 0.13  &  9.60& 0.24 &\\
% mfix averaged_sep CEFF
 \hline
A1e     & 1.105  & & 0.038& 0.02  & 1.228& 0.24  & 5772&  & 1.500& 0.10  &  106.5& 0.46  &  5.16& 0.43  & 2.64\\
B1e     & 0.934  & & 0.041& 0.01  & 0.872& 0.66  & 5286&  & 0.533& 0.44  &  161.6& 0.44  &  9.42& 0.17 &\\
\hline
% mfix averaged_sep radii+atmo
%A1ra    & 1.105&   &  0.038&0.03   &  1.226& 0.06  & 5772 & &1.498& 0.14   & 106.2 &0.22  &  5.08& 0.51  & 
%2.10\\
%B1ra     & 0.934&  &  0.040&0.00 &  0.870& 0.44   & 5297 & &0.535 & 0.50    & 161.6 &0.44  &  9.3  &0.14 & \\
% \hline
% mfix rox + atmo
A1-3    & 1.105 &   &  0.035 &0.07   &  1.224& 0.00   & 5767 & &1.488& 0.16   & 106.5 &   &  5.77&  0.99  & 
2.08\\
B1-3    & 0.934&    &  0.038 &0.01   &  0.871& 0.29   & 5315 & &0.543 & 0.51  & 161.6 &0.04  &  9.85  &  & \\
\hline
% changing mass + averaged_sep
A2     & 1.104   & 0.00  & 0.039& 0.01  &  1.226& 0.13 & 5782 && 1.509& 0.04    & 106.6& 0.55  & 5.35& 0.26   & 
2.20 \\
B2      & 0.926  & 0.32 & 0.042& 0.01  &  0.870& 0.38 & 5259 && 0.520& 0.12    & 161.6& 0.09 & 9.72 & 0.30    & 
\\
\hline
% changing mass + averaged_sep + 1 MLT
A2c     & 1.107   & 0.01  & 0.036& 0.07  &  1.227& 0.22 & 5778 && 1.508& 0.04    & 106.6& 0.45  & 6.28& 0.03   & 
2.89 \\
B2c      & 0.919  & 0.99  & 0.040& 0.00  &  0.870& 0.37 & 5210 && 0.501& 0.00    & 161.0& 0.00 & 10.54 & 0.69    
& \\
\hline
% changing mass + averaged_sep + FST
A2f     & 1.105& 0.00    & 0.039 &0.01 &  1.226& 0.12  & 5784 && 1.510& 0.03    & 106.4& 0.32  & 5.35 & 0.27  & 
1.80 \\
B2f      & 0.927&0.28  & 0.041  &0.01 &  0.869& 0.28  & 5261 && 0.519& 0.13   & 161.6 & 0.07  & 9.72 & 0.29  & 
\\
\hline
% changing mass + averaged_sep + 1 punto SSEP B
%A2s     & 1.105& 0.00    & 0.039& 0.01  &  1.227& 0.20  & 5782 && 1.510& 0.03    & 106.5& 0.51  & 5.60 & 0.11  
%& 1.88 \\
%B2s      & 0.926& 0.38  & 0.042& 0.02 &  0.870& 0.39   & 5262 && 0.520& 0.15   & 161.6 & 0.07  & 10.26 & 0.01  
%& \\
%\hline
% rox mlt
A3    & 1.110& 0.06  &  0.038 & 0.01  & 1.224 & 0.00 & 5791 & &1.512& 0.01  &  106.6&  &  5.87  & 0.94&1.46\\
B3     & 0.927& 0.18  &  0.042& 0.02  & 0.869 & 0.16& 5259 & &0.518& 0.07  &  161.4 & 0.03 &  10.16 & &\\
 \hline
% rox 1 param mlt
A3c     & 1.113& 0.17  & 0.038& 0.02   & 1.223& 0.01  & 5819& & 1.540& 0.04 & 106.8 &  &  5.77 & 0.87& 1.67\\
B3c     & 0.922& 0.40  & 0.041& 0.00    & 0.870& 0.16  & 5206& & 0.497& 0.01 &  161.1& 0.00 & 10.22&   &\\
 \hline
% rox mlt sun
$\rm A3\alpha_{\odot}$ & 1.114 & 0.15   & 0.038 & 0.02  & 1.224& 0.00  & 5807&  & 1.529& 0.00  & 106.8 & & 5.94& 
0.75  & 1.60\\
$\rm B3\alpha_{\odot}$ & 0.921 & 0.47   & 0.041 & 0.01 & 0.869 & 0.15 & 5190&  & 0.491& 0.04 & 160.7 & 0.02  & 
10.35&  &\\
\hline
% rox fst atmos no bug
A3f     & 1.110 & 0.06 & 0.038& 0.01   & 1.224& 0.00  & 5790&  & 1.511&0.02  & 106.5&   & 5.85 & 0.92  & 1.40\\
B3f    & 0.927 & 0.16 & 0.042& 0.01  & 0.868 & 0.12 & 5260&  & 0.518&0.07  & 161.4& 0.02   & 10.14&   &\\
% rox no diff
\hline
A3nd     & 1.108& 0.02  &  0.040& 0.00 & 1.224& 0.00   & 5795& & 1.516& 0.01  &  106.5&  &  5.90 & 0.95 & 1.31\\
B3nd     & 0.929& 0.10  &  0.040& 0.00 & 0.869& 0.19  & 5240& & 0.511& 0.02  &  161.6& 0.04  &  10.16&  &\\
% rox ceff
\hline
A3e     & 1.109& 0.05  &  0.038& 0.01  & 1.224& 0.00  & 5792& & 1.514&0.01 & 106.6 &  & 5.89 & 0.95 & 1.45\\
B3e     & 0.927& 0.16 &  0.042 & 0.01  & 0.869& 0.17  & 5256& & 0.517&0.06  &  161.5&0.03  & 10.17 &  &\\
\hline
% rox fst
%A4     & 1.110& 0.07  & 0.038 & 0.01  & 1.224 & 0.00& 5790&  & 1.513& 0.01  & 106.3&   & 5.82& 0.94   & 1.38\\
%B4     & 0.927& 0.15  & 0.041 & 0.01 & 0.866 & 0.10& 5262& & 0.518& 0.07  & 161.4& 0.01   & 10.11&   &\\
% \hline
\par
% rox fst atmos no bug + 2 sigma massB
%A4as     & 1.107 & 0.01 & 0.039& 0.01   & 1.224& 0.00  & 5797 &  & 1.520 &0.00  & 106.2&   & 5.91 & 0.92  & 
%1.17\\
%B4as     & 0.921 & 0.15 & 0.042& 0.01  & 0.866 & 0.05 & 5242&  & 0.509   &0.01  & 161.4 & 0.01   & 10.25&   &\\
% \hline
\par
% rox overshoot
A4  & 1.112& 0.13  &  0.036& 0.05  & 1.224 &0.00&  5782& & 1.503& 0.05 &  106.7 &     & 5.99& 1.16 &1.96\\
B4  & 0.925& 0.27  &  0.039& 0.0   & 0.869 &0.15 & 5275& & 0.524&0.13  &  161.5& 0.02  & 10.56& &\\
% rox mix2
\hline
A5  & 1.109 & 0.04 &  0.028 & 0.02 & 1.224 & 0.00& 5791 & & 1.513 & 0.01 &  106.7&   &  5.86& 0.95  &1.51\\
B5  & 0.927 & 0.17 &  0.030 & 0.01 & 0.869 & 0.20 & 5251&  & 0.516& 0.05 &  161.6& 0.05  &  10.12 &    &\\
\par
% no seismology
\hline
Ans     & 1.105 &  & 0.039 &  & 1.224 & & 5800 & &1.521  & &107.0 &  &  3.57 & & 0.06\\
Bns     & 0.934 &  & 0.041 &  & 0.863 & & 5238 & &0.502  & &164.3 &  &  8.27 & &\\
\hline
 \end{tabular}
\end{table}