\begin{table}%T2
\caption{\label{param}Best fit model parameters for the polar (p), intermediate~(i), and disk wind~(d). The mass fluxes are assumed to be constant within the indicated $\theta$-ranges
and have an error on the order of~20\%.}
%\centering
\par
\begin{tabular}{lrrrccc}
\hline
\hline
 & $T_{0}$  &  $T_{\infty}$ & $\theta_{\rm min}$ & $\theta_{\rm max}$ &
   $v_{\infty}$ & $F_{\rm m}(\theta)$ \\
 & [K] & [K] & [$\degr$] & [$\degr$] & [km~s$^{-1}$] &
   [g~s$^{-1}$~cm$^{-2}$] \\
\hline
p & 50~000 & 10~000 &  0 & 45 & 85 & $7.2\times 10^{-2}$ \\
i & 50~000 & 10~000 & 45 & 78 & 45 & $1.5\times 10^{-1}$ \\
d & 10~000 &  6000 & 78 & 90 & 35 & $5.5\times 10^{-1}$ \\
\hline
\end{tabular}
\end{table}