\begin{table}%t5
\caption{Integrated flux densities ({\it FD}) of VRO42.05.01.\label{tab5}}
\par
%\centerline
{\begin{tabular}{cccc}
\hline
\hline
Freq. &Beamwidth &{\it FD} & References\\
MHz   &arcmin    &~Jy               & \\
\hline
  38.0 & 45 $\times$ 45 & 22.4*        &  Williams et~al. (1966)\\
  83.0 & 59 $\times$ 31 & 20.0 $\pm$ 7.0&  Kovalenko et~al.  (1994) \\ 
 408.0 & 45 $\times$ 45 & 9.0 $\pm$ 1.6 &  Haslam \& Salter (1971)  \\
 408.0 &3.4 $\times$ 5.1& 8.1 $\pm$ 1.0 & this paper\\
 610.0 & 15 $\times$ 15 & 7.5 $\pm$ 1.0 &  Dickel et~al. (1965)\\
 1400.0& 10 $\times$ 10 & 6.8          &  Felli \& Churchwell (1972)\\
 1420.0& 1 $\times$ 1.4 & 6.0 $\pm$ 0.8 &  Landecker et~al. (1982)\\
 1420.0& 1 $\times$ 1.5 & 5.2 $\pm$ 0.2 & this paper\\
 2965& 3.4 $\times$ 3.4 & 4.6 $\pm$ 0.2 & see text \\
 2700.0& 5 $\times$ 5   & 5.2** $\pm$ 1.0 &  Willis  (1973)\\
\hline
\end{tabular}}\medskip
\par
 *Corrected using scale correction
 of Roger et~al. (1973). 
\par
 **Probably high due to inclusion of compact sources to the northeast.%\\\vspace*{1mm}
\end{table}