\begin{table}%t1
%\centering
\par
\caption{List of brightest compact sources and their Flux Densities ({\it FD}) inside OA184 and VRO42.05.01.}\label{tab1}
\begin{tabular}{cccccc}
\hline
\hline
 Source num. &GLONG& GLAT & {\it FD} at 408~MHz& {\it FD} at 1420~MHz& Sp. index\\
 &deg &deg &mJy&mJy&$\alpha$\\
\hline
For OA184\\
\hline
1&   165.887&2.055 &664 $\pm$ 20&229 $\pm$  9&0.86 (0.81 to 0.90)\\
2&   165.735&2.450 &309 $\pm$ 33&273 $\pm$ 22&0.10 (--0.05 to 0.25)\\
3&   166.198&3.120 &196 $\pm$ 8& 93 $\pm$  4&0.60 (0.56 to 0.65)\\
4&   166.006&2.425 &182 $\pm$ 6& 88 $\pm$  3&0.58 (0.54 to 0.62)\\
5&   166.605&2.803 &150 $\pm$ 10& 60 $\pm$  3&0.74 (0.67 to 0.81)\\
6&   166.615&3.175 &121 $\pm$ 7& 53 $\pm$  3&0.66 (0.60 to 0.73)\\
7&   166.604&3.077 & 96 $\pm$ 7& 24 $\pm$  3&1.10 (0.99 to 1.23)\\
8&   166.211&2.359 & 90 $\pm$ 6& 36 $\pm$  2&1.74 (1.68 to 0.81)\\
9&  166.195&2.768 &  59 $\pm$ 4& 31 $\pm$  1&0.67 (0.61 to  0.75)\\
10&  166.440&2.850 & 50 $\pm$ 4& 28 $\pm$  1&0.46 (0.40 to  0.52)\\
11&  165.990&3.036 & 47 $\pm$ 14& 14 $\pm$  5&1.00 (0.68 to  1.53)\\
12&  166.391&3.169 & 45 $\pm$ 5& 17 $\pm$  2&0.78 (0.66 to  0.92)\\
13&  166.535&2.102 & 45 $\pm$ 3& 31 $\pm$  1&0.30 (0.25 to  0.36)\\
14&  166.821&2.345 & 40 $\pm$ 5& 26 $\pm$  1&0.35 (0.25 to  0.47)\\
15&  166.878&2.826 & 39 $\pm$ 10& 20 $\pm$  4&0.54 (0.32 to 0.85)\\
16&  165.895&2.316 & 26 $\pm$ 7& 14 $\pm$  4&0.49 (0.24 to  0.84)\\
17&  165.926&1.839 & 20 $\pm$ 2& 10 $\pm$  1&0.60 (0.50 to 0.71)\\
\hline
For VRO42.05.01 \\
\hline
1&   166.327&4.024 &151 $\pm$ 17& 70 $\pm$ 10&0.62 (0.41 to 0.83)\\
2&  166.327&4.040 & 73 $\pm$ 16& 35 $\pm$ 10&0.59 (0.34 to 0.96)\\
3&  166.696&4.351 & 53 $\pm$ 4& 26 $\pm$ 1&0.57 (0.50 to 0.65)\\
\hline
\end{tabular}
\end{table}