\begin{table}%t10
\caption{Uncertainties in Fe abundances for stars observed with UVES.}\label{t:errorparam}
%\centering
\par
\begin{tabular}{lccccccc}
\hline  \hline
Parameter   & Variation  &$[$Fe/H$]$I&$[$Fe/H$]$II& Random   & Systematic & Total & Total \\
            &            &         &          & Error    &  Error   &Random & Syst. \\
\hline
$EW$s         &            &         &          &          &          & 0.013 & 0.006 \\ 
$\log gf$   &            &         &          &          &          &       & 0.019 \\
$T_{\rm eff}$ & 100 K    & ~~0.109 & $-$0.025 &   10 K   &   50 K   & 0.011 & 0.054 \\
$\log g$    & +0.3 dex   &$-$0.013 &  ~~0.125 & 0.02 dex & 0.15 dex & 0.000 & 0.006 \\
$[$A/H$]$   & +0.2 dex   & ~~0.003 & $-$0.013 & 0.03 dex & 0.06 dex & 0.001 & 0.001 \\
$v_{\rm t}$       & +0.2 km s$^{-1}$  &$-$0.045 & $-$0.025 & 0.09 km s$^{-1}$& 0.06 km
s$^{-1}$& 0.020 & 0.013 \\
\\                         
Total       &            &         &          &          &          & 0.026 & 0.056 \\
\hline
\end{tabular}
\end{table}