\begin{table}%t2
\caption{Optical emission line fluxes in units of 
      $\rm 10^{-13}~ erg~s^{-1}~cm^{-2}$, [TiO]$_{1}$ molecular index and $V_{\rm sp}$ magnitudes.
\label{optflx}}
%\centerline
{\begin{tabular}{lrrrrrrrrrrrrr} \hline\hline
JD$^1$  & --55 & 590 & 1065/70 & 1325 & 1422/4 & 1755/7 & 1791 & 1826/8 & 2018& 2060 & 2133/5&2390 & 
2528/32 \\ 
$\phi$ & 0.428 & 0.563 & 0.402 & 0.856 & 0.029 & 0.614 & 0.677 & 0.738 & 0.075 & 0.150 & 0.279 & 0.730 & 
0.976\\ 
\hline
H$\gamma$~4340 & 9.5 & 18.5  & 14.3 &    & 1.9 & 10.5 & 13.0 & 18.9 & 4.1 &  &7.2 & &3.3 \\
{}[\ion{O}{iii}]~4363& 0.4 & 2.2  & 0.1 &     & 1.8 & 3.8  &  4.7& 3.7  & 2.3 &  & 2.6& &1.1 \\
\ion{He}{i}~4388  & 1.0 & 2.1  & 1.2 &     & 0.1 & 1.0  & 1.9  & 1.0  & 0.2 &  & 0.6& & \\
\ion{He}{i}~4471 & 1.0 & 4.5  & 2.6 &    & ...  & 1.2  & 1.7    & 1.2  & 0.5 &  & 0.4 & &0.5\\
\ion{He}{ii}~4541 & 0.6 & ... & ... &    & ... & 0.6   & 1.5   & 0.9   & 0.5 &  & 0.5 & &0.4\\
\ion{Fe}{ii}~4584  & 0.4 &   & ... & ... & 0.8  & 0.3 & 0.6 & 0.3 & ... &  & 0.2 &... &...\\
\ion{Fe}{ii}~4629 & ...  &    & 0.6 & 0.1 & 0.2 & 0.2 & 0.5 & 0.3 & ... &  & 0.1 &... &...\\
\ion{N}{iii}~4634 & 0.3  & ...  & ...   & 0.2 & 0.7 & 1.6 & 0.8 & ... & ... &  & ...&... &... \\
\ion{N}{iii}~4641 &  0.6 & ...  & ...  & ...  &  ...   & 2.1 & 4.4 & 1.7 & 0.3 &  &0.4& &0.2\\
\ion{He}{ii}~4686 & 14.0 & 0.9 & 0.1 & 8.5 & 3.4 & 18.3 & 31.7 & 21.3 & 11.5 &  &17.1& &7.1\\
H$\beta$~4861 & 25.1 & 42.7 & 41.4 & 25.0 & 5.5 & 29.7 & 36.5 & 39.2 & 9.4 &  & 22.7& 19.0 &7.2\\
\ion{He}{i}~4922 & 3.2  & 2.9  &  1.6 &  2.2  & 0.3 & 3.0 & 3.8 & 2.5 & 0.5 &   & 1.7 & 1.0 &0.2\\
\ion{Fe}{ii}~4924  &  0.3 &     & 1.1  & 0.1 & ... & 0.3 & 0.7 & 0.2 & 0.1 &  & ... &... &\\
{}[\ion{O}{iii}]~4959 & ... &      & ...  & 3.2 & 1.4 & 2.4 & 2.2 & 1.1 & 0.6 &  & 0.8 &0.2 &0.4\\   
{}[\ion{O}{iii}]~5007 & 0.2 & 3.3 & 1.4 & 9.7 & 3.7 & 7.5 & 5.0 & 3.7 & 1.9 & & 2.3 &0.9 &1.0\\
\ion{He}{i}~5016 & 1.7 & 3.6  &  2.8 & 2.2 & 0.4 & 1.6 & 2.0 & 1.2 & 0.5 & & 0.8 &0.4 &0.3\\
\ion{Fe}{ii}~5018  & 0.7 &     & 1.1 & 0.2  & 0.2 & 0.6 & 1.1 & 0.6 & 0.1 &   & 0.2&0.2 &...\\
\ion{He}{i}~5047  & 0.6  & ...  & 0.8 & 9.6 & ... & 0.3  & 1.4 & 1.1 & ... &   & ...&0.3 &... \\
\ion{He}{ii}~5411 & 1.3  & ...  & ... & 0.3 & 0.2 & 1.6 & 3.9 & 1.8 & 1.0 &  & 1.4&1.3 &0.7\\
{}[\ion{Fe}{vii}]~5720 & 0.6  &  ...  & ... & ... & ... & 0.4 & 0.6 & 0.8 & 1.2 & 1.2 & 1.3&1.8 &1.4 \\
\ion{He}{i}~5876 & 6.1 & 10.7 & 9.4 & 10.3 & 2.4 & 6.1 & 8.2 & 8.7 & 2.6 & 1.7 & 4.0&2.2 &2.8 \\
{}[\ion{Fe}{vii}]~6087 & 0.9 & ... & ... & ... & 0.3 & 0.7 & 1.1 & 1.1 & 2.0 & 2.3 & 2.8&2.9 &2.2 \\
H$\alpha$~6563 & 127 & 207 & 180 & 192 & 43.0 & 118 & 208 & 187 & 51.0 & 58.7 & 105& 84 &44.9\\
H$\alpha$~CA$^3$ &...&     & 64  & 38  & 42   & 25  & 38  & 51  & 11   & 7.1  & 5.3&... &6.2 \\ 
\ion{He}{i}~6678 & 13.1 & 5.4 & 4.2 & 6.1 & 1.5 & 8.7 & 9.0 & 8.7 & 2.4 &  1.7  & 3.2&2.5 &0.7\\
\ion{O}{vi}~6825  & 2.7 & ... & ... & ... & ... & ... & ... & 2.5: & ... & 0.5: & 2.3:&2.4 &1.1 \\
\ion{He}{i}~7065 & 6.6 & 5.5 & 4.9 & 10.2 & 2.3 & 6.6 & 8.5 & 10.1 & 3.8 & 1.9 & 3.9&2.2 &2.7\\
\ion{He}{i}~7281 & 2.5 & 1.3 & 0.8 & 1.8  & 0.3 & 1.5 & 2.3 & 1.6 & & 0.6 & 0.6&0.9 &0.2 \\
\hline
{}[TiO]$_1$ & 0.27 & 0.075 & 0.21 & 0.30 & 0.71 & 0.45 &   & 0.46 & 0.64 & 0.35 & 0.35&0.35 &0.34 \\
\hline
$V_{\rm sp}$~[mag] & 12.5 & 11.4 & 11.3$^2$ & 12.1 & 13.4 & 11.7 & 11.6 & 12.5  & 13.2 & 12.6 & 12.7& 
12.7 & 13.4 \\
\hline
\end{tabular}}
\par
\smallskip
\par
\noindent $^1$ Julian Date = 2~450~000 +  JD listed in table;
\noindent $^2$ scaled to $V_{\rm sp} = m_{\rm vis}$;
\noindent $^3$ central absorption.
 \end{table}