\begin{table}%t2
%\centering
\par
\caption{Log of the observations of the stars in the spectral
atlas. Columns show the same as Table~\ref{tab:lbvobs}, except Col.~4 which shows the MK~spectral type of each of the stars. All
observations were done at the AAT, and all used a 1200R grating with
the exception of HD 183143 which used a 600V grating. All stars were
observed on 15/2/04 with the exception of HD 183143 and HD 32034 which
were observed on 15/9/02 and 15/8/03
respectively. \label{tab:atlasobs}}
\par
  \begin{tabular}{lccccccc}
	\hline\hline
      	Name 	& \multicolumn{2}{c}{Coords (2000)} & Spec. & Integration & Slit & {\it S/N} & Res. \\ 
		& $\alpha$ & $\delta$		      & type &	 time (s)  & width (\arcsec) & & (\AA)  \\
      	\hline 
\object{HR 5281}&14 06 25.2&--59 42 57&B0Iae&120&1.5&350&1.2	\\
\object{HR 5027}&13 20 48.3&--55 48 03&B0.5Iae&590&1.5&550&1.2	\\
\object{HR 6142}&16 31 41.8&--41 49 02&B1Iae&70&1.5&600&1.2	\\
\object{HR 4806}&12 38 52.4&--67 11 35&B1Ia&1260&2&600&1.2	\\
\object{HR 4653}&12 14 16.9&--64 24 31&B1.5Iae&530&2&700&1.2	\\
\object{HR 4198}&10 42 40.6&--59 12 57&B2.5Iae&660&1&500&1.1	\\
\object{HR 3940}&09 56 51.7&--54 34 04&B5Ia&100&2&1100&1.2	\\
\object{HR 4611}&12 05 53.6&--65 32 49&B6Iab&600&1.5&450&1.2	\\
\object{HD 183143}&19 27 26.6&+18 17 45&B8Iae&120&1&900&2.1	\\
\object{HD 32034}&04 55 11.1&--67 10 11&B9Iae&960&2&100&1.2	\\
\object{HR 4169}&10 37 27.1&--58 44 00&A0Iae&180&1.5&400&1.2	\\
\object{HR 4228}&10 48 05.4&--59 55 09&A0Ia &200&1&400&1.1	\\
\object{HR 3975}&10 07 20.0&+16 45 46&A0Ia &120&1&800&1.1	\\
\object{HR 4352}&11 48 45.1&--26 44 59&A6Ia&120&1&700&1.1	\\
      \hline
      \end{tabular}
\par
\end{table}