\begin{table}%t1
      \caption{Measurements of the correlation length $r_0(z)$
and the correlation function slope $\gamma(z)$. The associated
$1\sigma$ errors are reported. $r_0$ values are computed
both with letting $\gamma$ free, and setting $\gamma$ to
the mean $1.78$ in the range $z=[0.2,~1.3]$ in the VVDS-F02 and VVDS-CDFS.
To compare to the DEEP2 measurements of \citet{coil},
we have set $\gamma=1.66$ for the VVDS-F02-DEEP2 in $z=[0.7,~0.9]$ and
$z=[0.9,~1.35]$, and $\gamma=1.68$ for the VVDS-F02-DEEP2 in $z=[0.7,~1.35]$.
The redshift range,
number of galaxies used, mean absolute magnitude $M_{B_{AB}}$ and
rest frame color $B-I_{AB}(z=0)$, are indicated for each subsample.\label{meas}}
      $$
\begin{array}{llcccccc}
           \hline\hline
            \noalign{\smallskip}
            $Field$ & $Redshift$ & N_{\rm gal} & {\rm mean}       & $mean $         & r_0(z) & \gamma & r_0(z)\\
                    &  {\rm range}     &         & M_{B_{AB}} & B-I_{AB}(z=0) & h^{-1}~ $Mpc$  &        & ($fixed$\ \gamma) \\     
            \noalign{\smallskip}
            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} & [0.2{-}0.5] &  1258   &     -17.57 &   1.34 & 2.23_{-0.51}^{+0.46} & 1.67_{-0.11}^{+0.17} &  2.27_{-0.52}^{+0.47}\\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} & [0.5{-}0.7] &  1443   &     -18.68 &   1.28 & 2.69_{-0.59}^{+0.53} & 1.71_{-0.11}^{+0.18} &  2.51_{-0.55}^{+0.49}\\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} & [0.7{-}0.9] &  1398   &     -19.20 &   1.36 & 2.87_{-0.52}^{+0.51} & 1.72_{-0.12}^{+0.19} &  2.87_{-0.52}^{+0.50}\\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} & [0.9{-}1.1] &  1025   &     -19.66 &   1.35 & 2.87_{-0.66}^{+0.62} & 1.77_{-0.14}^{+0.24} &  2.75_{-0.63}^{+0.60}\\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} & [1.1{-}1.3] &  561    &     -20.26 &   1.35 & 3.09_{-0.65}^{+0.61} & 1.96_{-0.21}^{+0.27} &  2.93_{-0.62}^{+0.58}\\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} & [1.3{-}2.1] &  432    &     -20.93 &   1.25 & 3.63_{-0.76}^{+0.63} & 1.92_{-0.31}^{+0.31} &  3.69_{-1.00}^{+0.77}\\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} $"DEEP2'' selection$ & [0.7{-}1.35] &  1620 & -20.00 & 1.36 &  3.05_{-0.53}^{+0.51} & 1.56_{-0.11}^{+0.14} & 3.17_{-0.55}^{+0.53} \\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} $"DEEP2'' selection$ & [0.7-0.9] &  687 & -19.65 & 1.41 & 3.59_{-0.83}^{+0.77} & 1.65_{-0.17}^{+0.25} & 3.59_{-0.83}^{+0.77} \\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}02{\rm h} $"DEEP2'' selection$ & [0.9{-}1.35] &  933 & -20.25 & 1.32 &  3.29_{-0.59}^{+0.57} & 1.82_{-0.15}^{+0.19} & 3.13_{-0.57}^{+0.54} \\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
              {\rm VVDS}\mbox{-}{\rm CDFS} & [0.4{-}0.7] &  421 & -19.44 & 1.30 & 3.19_{-1.01}^{+0.93} & 1.45_{-0.17}^{+0.25} & 3.31_{-1.26}^{+1.06} \\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}{\rm CDFS} & [0.6{-}0.8] & 372 & -19.74 & 1.47 & 4.55_{-1.46}^{+1.25} & 1.48_{-0.15}^{+0.28} & 4.15_{-1.50}^{+1.25}\\
            \noalign{\smallskip}
%            \hline
            \noalign{\smallskip}
            {\rm VVDS}\mbox{-}{\rm CDFS} & [0.8{-}1.5] & 452 & -20.43 & 1.34 & 3.53_{-1.66}^{+1.29} & 1.66_{-0.27}^{+0.40} & 3.49_{-1.78}^{+1.28}\\
\noalign{\smallskip}
\hline
\end{array}
      $$
\end{table}