\begin{table}%t6
%\centering
\par
\caption{Comparison of measured scatter in Figs.~\ref{fig:abunds} and~\ref{fig:abunds_mg} with relative errors in the abundance ratios.  For each plot we report the minimum, mean and maximum measured $1\sigma$ scatter $\sigma_{\rm meas}$ across the range of [Fe/H] or [Mg/H], which is compared to the average relative error in the abundance ratio $\sigma^{\rm rel}$.  The ratio of the mean measured scatter to the estimated error $\langle \sigma_{\rm meas} \rangle /\sigma^{\rm rel}$ is reported in the last column.
\label{tab:scatter}}
\begin{tabular}{lccccc}
\hline\hline
 & min($\sigma_{\rm meas}$) &  $\langle \sigma_{\rm meas} \rangle$ & max($\sigma_{\rm meas}$) & $\sigma^{\rm rel}$ & $\langle \sigma_{\rm meas} \rangle /\sigma^{\rm rel}$ \\
\hline    
 {   [C/Fe]}   & 0.22   & 0.32  & 0.53   &  0.18   &  1.73  \\  
 {  [Mg/Fe]}   & 0.07   & 0.09  & 0.12   &  0.15   &  0.59  \\  
 {  [Al/Fe]}   & 0.17   & 0.20  & 0.21   &  0.17   &  1.13  \\  
 {  [Ca/Fe]}   & 0.08   & 0.09  & 0.10   &  0.15   &  0.59  \\  
 {  [Sc/Fe]}   & 0.09   & 0.11  & 0.13   &  0.16   &  0.69  \\  
 {  [Ti/Fe]}   & 0.08   & 0.09  & 0.12   &  0.15   &  0.61  \\  
 {   [V/Fe]}   & 0.06   & 0.09  & 0.11   &  0.15   &  0.60  \\  
 {  [Cr/Fe]}   & 0.10   & 0.12  & 0.14   &  0.16   &  0.72  \\  
 {  [Mn/Fe]}   & 0.13   & 0.16  & 0.21   &  0.16   &  1.03  \\  
 {  [Co/Fe]}   & 0.10   & 0.11  & 0.13   &  0.16   &  0.71  \\  
 {  [Ni/Fe]}   & 0.12   & 0.14  & 0.17   &  0.18   &  0.80  \\  
 {  [Zn/Fe]}   & 0.08   & 0.15  & 0.19   &  0.15   &  1.01  \\  
 {  [Sr/Fe]}   & 0.19   & 0.32  & 0.59   &  0.19   &  1.71  \\  
 {   [Y/Fe]}   & 0.21   & 0.25  & 0.32   &  0.17   &  1.47  \\  
 {  [Zr/Fe]}   & 0.13   & 0.19  & 0.23   &  0.16   &  1.18  \\  
 {  [Ba/Fe]}   & 0.37   & 0.50  & 0.69   &  0.18   &  2.77  \\  
 {  [Eu/Fe]}   & 0.21   & 0.37  & 0.62   &  0.16   &  2.34  \\  
 {	   }   &	      &       &        &	 &	  \\  
 {   [C/Mg]}   & 0.24   & 0.35  & 0.51   &  0.18   &  1.89  \\  
 {  [Al/Mg]}   & 0.15   & 0.19  & 0.23   &  0.18   &  1.03  \\  
 {  [Ca/Mg]}   & 0.07   & 0.08  & 0.09   &  0.15   &  0.56  \\  
 {  [Sc/Mg]}   & 0.10   & 0.11  & 0.12   &  0.18   &  0.60  \\  
 {  [Ti/Mg]}   & 0.08   & 0.09  & 0.11   &  0.17   &  0.55  \\  
 {   [V/Mg]}   & 0.12   & 0.13  & 0.14   &  0.16   &  0.79  \\  
 {  [Cr/Mg]}   & 0.12   & 0.15  & 0.19   &  0.18   &  0.84  \\  
 {  [Mn/Mg]}   & 0.17   & 0.21  & 0.30   &  0.17   &  1.26  \\  
 {  [Fe/Mg]}   & 0.08   & 0.10  & 0.14   &  0.15   &  0.63  \\  
 {  [Co/Mg]}   & 0.11   & 0.13  & 0.16   &  0.17   &  0.79  \\  
 {  [Ni/Mg]}   & 0.15   & 0.17  & 0.19   &  0.19   &  0.88  \\  
 {  [Zn/Mg]}   & 0.09   & 0.18  & 0.26   &  0.15   &  1.16  \\  
 {  [Sr/Mg]}   & 0.18   & 0.29  & 0.55   &  0.21   &  1.41  \\  
 {   [Y/Mg]}   & 0.23   & 0.25  & 0.30   &  0.19   &  1.36  \\  
 {  [Zr/Mg]}   & 0.15   & 0.22  & 0.29   &  0.17   &  1.27  \\  
 {  [Ba/Mg]}   & 0.33   & 0.48  & 0.60   &  0.20   &  2.40  \\  
 {  [Eu/Mg]}   & 0.22   & 0.39  & 0.60   &  0.18   &  2.18  \\  
\hline
\end{tabular}
\end{table}