\begin{table}%t1
%\centering
\par
\caption{A table of the relevant parameters to BAPS. The spectral parameters used were obtained using a standard spectral characterisation \citep{band}.}
\label{GRBs}
\begin{tabular}%{20pc}
{lll} 
\hline\hline 
GRB & {\it 930131} & {\it 960924}  \\ \hline
Trigger & 2151 & 5614 \\
$\eta^{\circ}$ & 170.7 & 162.4 \\
CONT bins (2.048 s) & 2 & 4 \\
Band model $\alpha$ & --1.2 & --0.3 \\
Band model $\beta$ & --2.5 & --9.9 \\
Band model $E_{\rm break}$ (keV) & 439 & 251 \\ \hline
\end{tabular}
\end{table}