\begin{table}%t8
%\centering
\par
\caption{Location and designation of the resonances in the photoionization spectrum of O$^{4+}$. See caption to Table~\ref{tab6}. The accuracy of the experimental energies listed is about 100~meV.\label{tab8}}
\begin{tabular}{lllll}
\hline\hline
Peak & \multicolumn{3}{c}{Energy (eV)}& Final state \\
& Exp. & MCDF & NIST & \\
\hline
1* & 105.84 & 105.6 & 105.9 & 2p6p $^{3}$D, $^{3}$P, $^{3}$S \\
2* & 108.44 & 108.2 & 108.5 & 2p7p $^{3}$D, $^{3}$P, $^{3}$S \\
3* & 110.21 & 109.9 && 2p8p $^{3}$D, $^{3}$P, $^{3}$S \\
4* & 111.48 & 111.1 && 2p9p $^{3}$D, $^{3}$P, $^{3}$S \\
5* & 112.35 &&& 2p10p $^{3}$D, $^{3}$P, $^{3}$S \\
6* & 113.12 &&& 2p11p $^{3}$D, $^{3}$P, $^{3}$S \\
7 & 116.39 & 116.39 && 2p6d $^{1}$P \\
8 & 118.82 & 118.83 && 2p7d $^{1}$P \\
9 & 120.60 & 120.42 && 2p8d $^{1}$P \\
10 & 121.74 & 121.52 && 2p9d $^{1}$P \\
	\hline
	\end{tabular}
\end{table}