\begin{table}%t7
%\centering
\par
\caption{Location and designation of the resonances in the photoionization spectrum of N$^{3+}$. The peak numbers refer to Fig.~\ref{fig4}, and *~denotes that the initial state of the transition belongs to the 2s2p~$^{3}$P metastable term -- otherwise the initial state is the 2s$^{2}$ $^{1}$S ground state. When several terms are given the MCDF and \citet{nist} energies correspond to the mean value of the terms energy weighted by their statistical population. The accuracy of the experimental energies listed is about 50~meV.\label{tab7}}
\begin{tabular}{lllll}
\hline\hline
Peak & \multicolumn{3}{c}{Energy (eV)}& Final state \\
& Exp. & MCDF & NIST & \\
\hline
1* & 69.85 & 69.60 & 69.90 &  2p5p $^{3}$D, $^{3}$P, $^{3}$S \\
2* & 72.75 & 72.48 & 72.73 & 2p6p $^{3}$D, $^{3}$P, $^{3}$S \\
3* & 74.45 & 74.20 & 74.47 & 2p7p $^{3}$D, $^{3}$P, $^{3}$S \\
4* & 75.59 & 75.28 & 75.60 & 2p8p $^{3}$D, $^{3}$P, $^{3}$S \\
5* & 76.31 & 76.0 & 76.35 & 2p9p $^{3}$D, $^{3}$P, $^{3}$S \\
6* & 76.85 &  & 76.88 & 2p10p $^{3}$D, $^{3}$P, $^{3}$S \\
7 & 77.72 & 77.86 & 77.93 & 2p5s $^{1}$P \\
8 & 78.88 & 78.78 & 78.91 & 2p5d $^{1}$P \\
9 & 81.49 & 81.33 & 81.51 & 2p6d $^{1}$P \\
	\hline
	\end{tabular}
\end{table}