\begin{table}%t3
%\centering
\par
\caption{Location and designation of the resonances in the photoionization spectrum of O$^{3+}$. See caption to Table~\ref{tab2}. The peak numbers refer to Figs.~\ref{fig3} and~\ref{fig.oiv}. The accuracy of the experimental energies listed is about 50~meV.\label{tab3}}
$$
\begin{tabular}{lllll}
\hline\hline
Peak & \multicolumn{3}{c}{Energy (eV)}& Transition \\
& Exp. & MCDF & NIST & \\
\hline
1* & 69.74 & 69.18 & 69.80 & 2s2p($^{3}$P)5d $^{4}$D, $^{4}$P \\
2* & 72.55 & 71.94 & 72.53 & 2s2p($^{3}$P)6d $^{4}$D, $^{4}$P \\
3* & 74.18 & 73.60 & 74.15 & 2s2p($^{3}$P)7d $^{4}$D, $^{4}$P \\
4* & 75.23 & 74.68 & & 2s2p($^{3}$P)8d $^{4}$D, $^{4}$P \\
5* & 75.95 & 75.41 && 2s2p($^{3}$P)9d $^{4}$D, $^{4}$P \\
6* & 76.44 & 75.94 && 2s2p($^{3}$P)10d $^{4}$D, $^{4}$P \\
7 & 78.16 & 77.4 & 78.3 &  2s2p($^{3}$P)5p $^{2}$P, $^{2}$D, $^{2}$S \\
8 & 79.53 &&&  \\
9 & 80.16 & 79.82 & 80.20 & 2p$^{2}$($^3$P)3d $^{2}$D \\
10 & $\!\!\!\!\!\!\sim 80.9$ $ \left\{ \begin{array}{l} \\ \end{array}\right. $ & $\!\!\begin{array}{l} 80.2 \\82.3 \end{array}$ & $\!\!\begin{array}{l}  \\81.43 \end{array}$ & $\!\!\begin{array}{l} {\rm 2s2p}(^{3}{\rm P)6p}~ ^{2}{\rm P},^{2}{\rm D},^{2}{\rm S} \\ {\rm 2s2p}(^{1}{\rm P)4p}~ ^{2}{\rm P},^{2}{\rm D},^{2}{\rm S} \end{array} $  \\
11 & 82.88 & 81.9 && 2s2p($^{3}$P)7p $^{2}$P, $^{2}$D \\
12 & 84.01 & 83.12 && 2s2p($^{3}$P)8p $^{2}$P, $^{2}$D \\
13 & 84.78 & 83.84 && 2s2p($^{3}$P)9p $^{2}$P, $^{2}$D \\
14 & 85.35 & 84.37 && 2s2p($^{3}$P)10p $^{2}$P, $^{2}$D \\
15 & 87.11 & 88.15 && 2s2p($^{1}$P)5p $^{2}$P, $^{2}$D \\
16 & 90.47 & 91.09 && 2s2p($^{1}$P)6p $^{2}$P, $^{2}$D \\
17 & 92.14 & 92.8 && 2s2p($^{1}$P)7p $^{2}$P, $^{2}$D \\
18 & 93.15 & 93.99 && 2s2p($^{1}$P)8p $^{2}$P, $^{2}$D \\
	\hline
	\end{tabular}
	$$
\end{table}