\begin{table}%t10
%\centering
\par
\caption{Location and designation of the resonances in the photoionization spectrum of F$^{3+}$. The peak numbers refer to Figs.~\ref{fig5} and~\ref{fig.fiv}. 2s$^2$2p$^2$ or 2s2p$^3$ (see 
Table~\ref{tab9}) has been left out of the initial configurations as well as 2s2p$^2$ from the final configurations of the transitions. When several terms are given, the MCDF and \citet{nist} energies correspond to the mean values. The accuracy of the experimental energies listed is about 
100~meV.\label{tab10}}
\begin{tabular}{lllll}
\hline\hline
Peak & \multicolumn{3}{c}{Energy (eV)}& Transition \\
& Exp. & MCDF & NIST & \\
\hline
1 & 79.57 & 78.9 & 79.67 & $^{5}$S $\to$ ($^{4}$P)5d $^{5}$P \\
2 & 82.56 & 81.7 && $^{5}$S $\to$ ($^{4}$P)6d $^{5}$P \\
3 & 86.42 & 86.1 && $^{1}$D $\to$ ($^{2}$D)4p $^{1}$D \\
4 & 87.26 & 86.6 &&  $^{1}$D $\to$ ($^{2}$D)4p $^{1}$F, $^{1}$P \\
5 & 88.10 & 86.5 && $^{3}$P $\to$ ($^{4}$P)5p $^{3}$S, $^{3}$D, $^{3}$P \\
6 & 91.35 & 89.5 && $^{3}$P $\to$ ($^{4}$P)6p $^{3}$S, $^{3}$D, $^{3}$P \\
7 & 93.04 & 92.6 && $^{1}$D $\to$ ($^{2}$D)5p $^{1}$F, $^{1}$P, $^{1}$D \\
&& 91.4 && $^{3}$P $\to $ ($^{4}$P)7p $^{3}$S, $^{3}$D, $^{3}$P \\
8 & 94.18 & 92.6 && $^{3}$P $\to $ ($^{4}$P)8p $^{3}$S, $^{3}$D, $^{3}$P \\
9 & 95.02 & 93.3 && $^{3}$P $\to $ ($^{4}$P)9p $^{3}$S, $^{3}$D, $^{3}$P \\
10 & 96.39 & 95.9 && $^{1}$D $\to$ ($^{2}$D)6p $^{1}$F, $^{1}$P, $^{1}$D \\
11 & 97.81 & 98.3 && $^{3}$P $\to$ ($^{2}$P)4p $^{3}$D, $^{3}$P \\
12 & 103.72 & 104.4 && $^{3}$P $\to$ ($^{2}$P)5p $^{3}$D, $^{3}$P \\
	\hline
	\end{tabular}
\end{table}