\begin{table}%T2
\caption{\label{tab2}Best-fit parameters of the GRB~000911 host galaxy obtained
with the {\sl Hyperz} code. Photometric redshift errors are at 68\%
confidence level. The value of the luminosity $L^\star$ at the knee of the 
galaxies luminosity distribution (as defined by Schechter \cite{Schechter1976}; see 
Sect.~4.3) is taken from Lilly et~al. (\cite{Lilly1995}).}
%\centering
\par
\begin{tabular}{ccccccc}
\hline
\hline
Template & $\chi^2$/d.o.f. & Photometric & Age   & $A_{\rm V}$ & $M_{\rm B}$ & $L/L^\star$ \\
galaxy   &              & redshift    & (Gyr) & (mag) &       &         \\
\hline
Irr-LMC & 0.685 & $\rm 0.904^{+0.125}_{-0.128}$ & 0.509 & 0.39 & $-$18.40 & 0.066 \\
Irr-Stb & 0.731 & $\rm 0.904^{+0.134}_{-0.130}$ & 0.509 & 0.55 & $-$18.38 & 0.066 \\
Irr-SMC & 0.732 & $\rm 0.904^{+0.149}_{-0.138}$ & 0.719 & 0.32 & $-$18.37 & 0.064 \\
\hline
\end{tabular}
\end{table}