\begin{table}%t2
    \caption{A list of spectral lines used for the stratification 
calculations with the excitation
potential (eV), oscillator strength ($\log~{gf}$) and Stark damping constant
($\log~\gamma_{\rm St}$).                    \label{strat_list}}
%\centerline
{\begin{tabular}{lcrrrl|lcrrrl}
\noalign{\smallskip}
\hline\hline
Ion &Wavelength &\ei~(eV)  &$\log~{gf}$&$\log~\gamma_{\rm St}$ & Ref.&Ion &Wavelength &\ei~(eV)  &$\log~{gf}$&$\log~\gamma_{\rm St}$& Ref.\\
\hline
\ion{Mg}{i} &  4702.991&    4.346 &   --0.666&  --4.46  &LZ   &\ion{Cr}{i} &  5298.494&	 2.900 &--0.350&  --3.749&K88 \\ 
\ion{Mg}{i} &  4730.029&    4.346 &   --2.409&    appx &JKPS &\ion{Cr}{ii}&  5305.865&	 3.827 &--2.160&  --6.599&RU  \\  
\ion{Mg}{ii}&  4739.593&   11.569 &   --0.660&    appx &KP   &\ion{Cr}{ii}&  5305.929&	10.760 &--0.170&  --5.348&RU  \\  
\ion{Mg}{ii}&  4739.709&   11.569 &   --0.820&    appx &KP   &\ion{Cr}{ii}&  5308.425&	 4.071 &--2.060&  --6.639&RU  \\  
\ion{Mg}{i} &  5172.684&    2.712 &   --0.402&  --5.47  &AZ   &\ion{Cr}{i} &  5344.757&	 3.449 &--1.060&  --5.344&MFW \\  
\ion{Mg}{i} &  5528.405&    4.346 &   --0.620&  --4.46  &LZ   &\ion{Cr}{i} &  5348.315&	 1.004 &--1.290&  --6.112&MFW \\  
\ion{Mg}{i} &  5711.088&    4.346 &   --1.833&    appx &LZ   &\ion{Cr}{ii}&  5564.716&	 8.227 &--2.080&  --5.670&RU  \\  
\ion{Mg}{i} &  6318.717&    5.108 &   --1.730&    appx &KP   &\ion{Cr}{ii}&  5564.741&	10.893 & 0.510&  --5.364&RU  \\  
\ion{Mg}{ii}&  6346.742&   11.569 &    0.020&  --3.50  &KP   &\ion{Cr}{ii}&  5569.110&	10.872 & 0.860&  --5.359&RU  \\  
\ion{Mg}{ii}&  6346.964&   11.569 &   --0.140&  --3.50  &KP   &\ion{Cr}{ii}&  5569.617&	10.904 & 0.710&  --5.358&RU  \\  
\ion{Mg}{ii}&  7896.366&    9.999 &    0.650&  --4.54  &KP   &\ion{Cr}{ii}&  6050.242&	11.098 & 0.210&  --4.683&RU  \\  
             &            &          &         &       &     &\ion{Cr}{ii}&  6053.466&	 4.745 &--2.220&  --6.633&RU  \\  
\ion{Si}{ii}&  5055.984&   10.074 &    0.593&  --4.78  &SG   &\ion{Cr}{ii}&  6068.023&	 6.686 &--1.736&  --6.559&K88 \\  
\ion{Si}{ii}&  5056.317&   10.074 &   --0.359&  --4.78  &SG   &\ion{Cr}{ii}&  6138.721&	 6.484 &--2.150&  --6.728&RU  \\  
\ion{Si}{i} &  5701.104&    4.930 &   --2.000&  --4.41  &GARZn&\ion{Cr}{ii}&  6147.154&	 4.756 &--2.890&  --6.656&RU  \\  
\ion{Si}{i} &  5708.400&    4.954 &   --1.320&  --4.41  &GARZn&\ion{Cr}{ii}&  6336.263&	 4.073 &--3.760&  --6.638&RU  \\  
\ion{Si}{i} &  5772.146&    5.082 &   --1.600&  --4.06  &GARZn&	      & 	   &	      &  &	       &    \\  
\ion{Si}{ii}&  5957.559&   10.067 &   --0.301&  --4.84  &SG   &\ion{Fe}{ii}&  5018.440&	 2.891 &--1.340&  --6.585&RU  \\   
\ion{Si}{ii}&  5978.930&   10.074 &    0.004&  --4.84  &SG   &\ion{Fe}{ii}&  5018.669&	 6.138 &--4.010&  --6.537&RU  \\   
\ion{Si}{i} &  6142.483&    5.619 &   --1.420&    appx &astr &\ion{Fe}{i} &  5019.160&	 4.580 &--2.080&  --5.895&GK  \\   
\ion{Si}{ii}&  6347.109&    8.121 &    0.297&  --5.04  &BBCB &\ion{Fe}{ii}&  5019.462&	 5.569 &--2.780&  --6.607&RU  \\   
             &          &          &         &         &     &\ion{Fe}{i} &  5269.537&	 0.859 &--1.321&  --6.300&BPS1\\   
\ion{Ca}{ii}&  4716.743&    7.047 &   --2.490&  --4.449 &astr &\ion{Fe}{ii}&  5278.938&	 5.911 &--2.680&  --6.696&RU  \\   
\ion{Ca}{ii}&  4721.022&    7.050 &   --2.330&  --4.449 &astr &\ion{Fe}{i} &  5281.790&	 3.038 &--0.834&  --5.489&BWLW\\   
\ion{Ca}{ii}&  4799.973&    8.438 &   --0.420&  --2.915 &TB   &\ion{Fe}{ii}&  5291.666&	10.480 & 0.540&  --5.468&RU  \\   
\ion{Ca}{ii}&  5021.138&    7.515 &   --1.217&  --4.612 &BWL  &\ion{Fe}{ii}&  5303.395&	 8.185 &--1.530&  --5.822&RU  \\  			  
\ion{Ca}{ii}&  5339.188&    8.438 &   --0.079&  --3.700 &TB   &\ion{Fe}{ii}&  5325.553&	 3.221 &--3.320&  --6.603&RU  \\   
\ion{Ca}{i} &  6439.075&    2.526 &    0.390&  --6.072 &SR   &\ion{Fe}{i} &  5326.142&	 3.573 &--2.071&  --6.209&BK  \\   
\ion{Ca}{i} &  6449.808&    2.521 &   --0.502&  --6.071 &SR   &\ion{Fe}{i} &  5434.523&	 1.011 &--2.122&  --6.303&BPS1\\   
\ion{Ca}{i} &  6455.598&    2.523 &   --1.290&  --6.072 &SR   &\ion{Fe}{i} &  5560.211&	 4.434 &--1.090&  --4.323&MRW \\   
\ion{Ca}{ii}&  6456.875&    8.438 &    0.410&  --3.700 &TB   &\ion{Fe}{ii}&  5567.842&	 6.730 &--1.870&  --6.578&RU  \\   
\ion{Ca}{i} &  6462.567&    2.523 &    0.262&  --6.072 &SR   &\ion{Fe}{i} &  5576.088&	 3.430 &--0.900&  --5.491&MRW \\   
             &            &          &         &       &     &\ion{Fe}{ii}&  5961.705&	10.678 & 0.670&  --4.950&RU  \\   
\ion{Cr}{ii}&  5046.429&    8.227 &   --1.740&  --5.909 &RU   &\ion{Fe}{ii}&  6071.426&	10.714 &--0.250&  --5.640&RU  \\   
\ion{Cr}{i} &  5265.148&    3.428 &   --0.529&  --5.324 &K88  &\ion{Fe}{i} &  6136.615&	 2.453 &--1.400&  --6.327&BPSS\\   
\ion{Cr}{i} &  5296.691&    0.983 &   --1.400&  --6.120 &MFW  &\ion{Fe}{i} &  6136.994&	 2.198 &--2.950&  --6.196&BPSS\\   
\ion{Cr}{i} &  5297.377&    2.900 &    0.167&  --4.307 &MFW  &\ion{Fe}{i} &  6137.691&	 2.588 &--1.403&  --6.112&BPS2\\   
\ion{Cr}{ii}&  5297.606&   10.754 &   --0.320&	 appx &RU   &\ion{Fe}{ii}&  6150.098&	 3.221 &--4.820&  --6.678&RU  \\   
\ion{Cr}{i} &  5298.016&    2.900 &   --0.060&  --4.051 &MFW  &\ion{Fe}{i} &  6335.330&	 2.198 &--2.177&  --6.195&BWLW\\   
\ion{Cr}{i} &  5298.272&    0.983 &   --1.150&  --6.117 &MFW  &\ion{Fe}{i} &  6336.824&	 3.686 &--0.856&  --5.467&BK  \\   
\hline                                
\end{tabular}}
\par
{LZ -- Lincke \& Ziegenbein (1971); JKPS -- J\"onsson et~al. (1984); KP -- Kurucz \& Peytremann (1975); AZ -- Andersen et~al. (1967);
SG -- Schulz-Gulde (1969); GARZn -- Garz (1974 -- corrected); BBCB -- Berry et~al. (1971); TB -- {\sc topbase} (Seaton et~al. 1992); BWL -- Black et~al. (1972);
SR -- Smith \& Raggett (1981); RU -- Raassen \& Uylings (1998); K88 -- Kurucz (1988); MWF -- Martin et~al.~(1988);
GK -- Gurtovenko \& Kostyk (1981); MRW -- May et~al.~(1974); BPS1 -- Blackwell et~al. (1979); BPSS -- Blackwell et~al. (1982a); 
BPS2 -- Blackwell et~al. (1982b); BWLW -- O'Brian et~al. (1991); BK -- Bard \& Kock (1994).}
-\end{table}