\begin{table}%t2
\caption{Best fit results for $p$, with the two~different radial velocity sets. The third line is a~weighted average of the two~individual measurements. Fourth and fith lines are the detailed quadratic contribution to the final error bar. Last line gives the final adopted value with the overall error bar. References are: (1) \citet{Bersier1994}; and (2)~\citet{Barnes2005}.}\label{table1} 
%\centering
\par
\begin{tabular}{rrc}  
\hline \hline
	$p\pm\sigma_{\rm Vrad.}$ & 
	1.269 $\pm$ 0.008 & ref. (1) \\ 
	 & 1.280 $\pm$ 0.012 & ref. (2) \\ 
	\hline
        $p\pm \sigma_{\rm Vrad.}$ & 1.273 $\pm$ 0.007 & consolidated \\
        $\sigma_{\rm interf.}$ & $\pm$0.020 \\
        $\sigma_{\rm dist.}$ & $\pm$0.050 \\
        \hline 
        $p$ & 1.27 $\pm$ 0.06 \\ 
\hline  
\end{tabular}
\end{table}