\begin{table}%t1
\caption{\label{char}\small Main characteristics of catalogues
KMAC1-T and \mbox{KMAC1-CU}.}
%\centering
\par
\begin{tabular}{lll}
 \hline\hline
Catalogue version	&      KMAC1-T  	 &	  KMAC1-CU\rule{0pt}{11pt} \\
Reference catalogues     &        Tycho2          &        CMC13, UCAC2 \\
Number of fields	&    	  159            &         192     \\
Declination zone  & 0$^{\circ}$ to +30$^{\circ}$ & 0$^{\circ}$ to +30$^{\circ}$ \\
Number of stars         &          104~796            &       115~032    \\
Precision of positions   &                     &                      \\
$V<14$~mag:              &     30--50~mas$^*$  &     30--50 mas$^*$   \\
                         &     50--80 mas$^{**}$ &  30--70 mas$^{**}$  \\               
$V=16$~mag:                &    170~mas$^*$     &    170 mas$^*$\\
                         &      180 mas$^{**}$  &    170 mas$^{**}$  \\
Formal precision of      &                      &                      \\
proper motions:         &      5--6~mas/year   &       5--6~mas/year     \\
Precision of photometry &                         &                 \\
$V<15$~mag:             &     0.02--0.04~mag$^{*}$ & 0.02--0.04~mag$^{*}$  \\
                       &     0.06--0.08~mag$^{**}$ & 0.06--0.08~mag$^{**}$  \\
\hline
\multicolumn{3}{l}{$^*$  internal errors;  ~ ~   ~ ~ $^{**}$  external errors}   \\
\multicolumn{3}{l}{Astronomical data included: 
$\alpha$, $\delta$, $\mu_{\alpha}$, $\mu_{\delta}$, 
$B$, $V$, $R$, $r'$, $J$}  \\
\hline
\end{tabular}
\end{table}