\begin{table}%t5
\caption{Multi-parameter fit and solution (weighted Data Set~2).}\label{tab:results4}
%\centerline
{
\begin{tabular}{cll@{}r@{}rccc}
\hline  \hline
Set && Freq.   & Amp.   & Phase & $S/N$ & $\sigma_{{\rm res}}$ & $R$ \\
 2  && \cd     &  mmag & 2$\pi$rad && mmag &\%\struutdown \\
\hline
  && {\it Filter y+V} && $N=2661$ & $\sigma_{{\rm init}}$ = 9.1 &&\struutup\\
  F1&& 0.482278      & 7.6  & 0.42 & 13  & 7.5 & \\
 (F0&& 0.241139      & 1.1  & 0.23 & 2.7 & --) & \\
  F2&& 11.99425      & 5.0  & 0.98 & 13  & 6.7 & \\
  F3&& 11.91064      & 4.0  & 0.63 & 10  & 6.1 & \\
  F4&& 12.11446$^{*}$& 2.9  & 0.00 & 8   & 5.8 & \\
  F5&& 12.77588      & 1.6  & 0.31 & 4.2 & 5.6 & 62\struutdown \\   
\hline
\end{tabular}}
\medskip
$^{*}$ Alternatively, the 1 (year)$^{-1}$ alias frequency 12.1172 \cd.
\end{table}