\begin{table}%t1
%\centering
\par
\caption{\label{obs}Central coordinates and photometric calibration coefficients 
for the 7 VLT FORS1 fields as indicated in Fig.~\ref{mapofhyd}.}
\begin{tabular}{lllllrlll}\hline\hline
Field & RA [2000] & Dec [2000] & ZP$_{\rm I}$ & ZP$_{\rm V}$ & CT$_{\rm I}$ & CT$_{\rm V}$ & $k_{ I}$ & $k_{V}$\\\hline  
1 & 10:36:36.0 &--27:32:50 & 26.629  & 27.477  &--0.02  & 0.05  & 0.090  & 0.160  \\
2 & 10:37:03.4 &--27:32:50 & 26.643  & 27.529  &--0.02  & 0.05  & 0.090  & 0.160  \\
3 & 10:37:30.7 &--27:32:50 & 26.643  & 27.529  &--0.02  & 0.05 & 0.090  & 0.160  \\
4 & 10:37:58.6 &--27:32:50 & 26.543  & 27.529  &--0.02  & 0.05 & 0.090  & 0.160  \\
5 & 10:36:36.0 &--27:26:45 & 26.665  & 27.532  &--0.02  & 0.05 & 0.090  & 0.160  \\
6 & 10:36:36.0 &--27:20:39 & 26.665  & 27.532  &--0.02  & 0.05 & 0.090  & 0.160  \\
7 & 10:36:36.0 &--27:14:27 & 26.665  & 27.532  &--0.02  & 0.05 & 0.090  & 0.160  \\\hline 
\end{tabular}
\end{table}