\begin{table}%t5
%\centering
\par
\caption{\label{H9} Free fitting parameters for the H$_{9}$ line. The wavelength difference
$\Delta\lambda$ between the narrow component and the broad component is also given.
In the first spectrum here are three and in the second spectrum two additional metal lines in the direct
vicinity of H$_{9}$ that had to
be fitted simultaneously to give the correct line profile. Especially for the fitting
of many lines, the errors should be treated
with caution and should be considered only as formal errors.}
\begin{tabular}{cccccccc}
\hline\hline
sp & \multicolumn{1}{c}{$A_{\rm n}$} & \multicolumn{1}{c}{$A_{\rm b}$} &${\rm \sigma_{n}}$ &${\rm \sigma_{b}}$ & ${\rm \lambda_{n}}$ & ${\rm \lambda_{b}}$ & ${\rm \Delta\lambda}$ \\  
  & \multicolumn{1}{c}{[electrons]}& \multicolumn{1}{c}{[electrons]} & [\AA]& [\AA]& [\AA]&[\AA]&[\AA]\\
\hline
1&3316 $\pm$ 84&6489 $\pm$ 127&0.21 $\pm$ 0.01&1.15&3835.37 $\pm$ 0.06&3835.34 $\pm$ 0.09&$-$0.03 $\pm$ 0.11\\
2&2520 $\pm$ 66&2846 $\pm$ 83&0.20 $\pm$ 0.01&1.00&3835.38 $\pm$ 0.06&3835.43 $\pm$ 0.11&0.05 $\pm$ 0.13\\
3&671  $\pm$ 41&486 $\pm$ 48&0.16 $\pm$ 0.01&0.48 $\pm$ 0.05&3835.37 $\pm$ 0.07&3835.49 $\pm$ 0.23& 0.12 $\pm$ 0.24\\
4&124 $\pm$ 19&55 $\pm$ 23&0.14 $\pm$ 0.01&0.40&3835.38 $\pm$ 0.08&3835.45 $\pm$ 0.27&0.07 $\pm$ 0.28\\
5&101 $\pm$ 13& & 0.17 $\pm$ 0.02& & 3835.37 $\pm$ 0.16 & & \\
6&75 $\pm$ 11 & & 0.14 $\pm$ 0.01& & 3835.43 $\pm$ 0.13& & \\
7&248 $\pm$ 20& & 0.21 $\pm$ 0.02 & &3835.40 $\pm$ 0.14 & & \\
8&458 $\pm$ 32&534 $\pm$ 42&0.19 $\pm$ 0.02&0.81 $\pm$ 0.08&3835.39 $\pm$ 0.09&3835.34 $\pm$ 0.29&$-$0.05 $\pm$ 0.30\\
\hline
\end{tabular}
\end{table}