\begin{table}%T1
%\centering
\par
%\setlength{\extrarowheight}{1pt}
\caption{Positions of the ULXs and their 0.3$-$8 keV X-ray luminosities. In the fields with only one ULX, the pointing center is the ULX. The field of NGC~4736 was centered in the middle of both sources. A~* in front of the ULX name denotes the pointing center. }
\label{tablePositions}
\begin{tabular}{clllc}
\hline \hline
FOV&Name & RA & Dec & X-ray Lum.\\
& & & & $[10^{39}~ {\mbox{erg}~{\rm s}^{-1}}] $ \\
\hline
1 *&M~33 &01:33:50.9 & +30:39:38 & 1 \\     
2 *&NGC~2403 & 07:36:25.5 & +65:35:40  & $2$ \\
\multirow{2}{*}3 *&M~82-D & 09:55:50.2 & +69:40:46  & $3$ \\ 
&M~82-F & 09:55:51.0 & +69:40:45  &$6$ \\
\multirow{2}{*}{4 *}&NGC~4736-1 & 12:50:53.1 & +41:07:13  &$1$ \\
&NGC~4736-2 & 12:50:53.3 & +41:07:14  & $1$\\ 
5 *& NGC~5204 & 13:29:38.6 & +58:25:06 & $2$ \\ 
6 *& NGC~5457-1 & 14:03:32.4 & +54:21:03 & $2$ \\
7 *& NGC~5457-2 & 14:04:14.3 & +54:26:04 & $1$ \\
\hline
\end{tabular}
\end{table}