\begin{table}%t1
\caption{\label{table-invert}Test of our magnetic field diagnostic method with the inversion code UNNOFIT. The points from~A to~H are localized on the map in Fig.~\ref{mag-field}, while those following compare results of the diagnostic method described in the present paper (Index 1) with results of the UNNOFIT inversion code (Index 2), for the longitudinal magnetic field $B_{//}$, the transverse magnetic field strength $B_{\bot}$, the transverse field azimuth direction referred with respect to the slit direction, which is also the meridian (map $Oy$~axis), the strength of the field vector $B_{\rm tot}$, and the inclination angle with respect to the line-of-sight.}
%\centering
\begin{tabular}{crrrrrrrrrr}
\hline\hline
Point & $B_{//}$ & $B_{//}$ & $B_{\bot}$ & $B_{\bot}$ 
& Azimuth & Azimuth 
& $B_{\rm tot}$ & $B_{\rm tot}$ 
& Inclination & Inclination \\
 & Gauss & Gauss & Gauss & Gauss & degree & degree & Gauss & Gauss 
& degree & degree \\
 & 1 & 2 & 1 & 2 & 1 & 2 & 1 & 2 & 1 & 2 \\
\hline
A & --1711 & --1958 &  365 &  479 &  --86 & --126 & 1750 & 2016 & 168 & 166 \\
B &  --787 &  --849 & 1012 & 1403 &  --82 &  --90 & 1282 & 1640 & 128 & 122 \\
C & --1000 & --1054 & 1000 & 1267 &  +23 &  +10 & 1414 & 1648 & 135 & 130 \\
D &  +269 &  +341 &  222 &  207 &  +21 &  +35 &  349 &  341 &  40 &  37 \\
E &  +103 &   +99 &  170 &  198 &  +20 &  +35 &  199 &  221 &  59 &  63 \\
F &   --93 &   --87 &  200 &  153 &  --89 & --108 &  221 &  176 & 115 & 120 \\
G &  +952 &  +828 &  436 &  548 &  +21 &  +35 & 1047 &  993 &  25 &  34 \\
H &  +570 &  +556 &  452 &  485 &  +38 &  +48 &  728 &  738 &  38 &  41 \\
\hline
\end{tabular}
\end{table}