\begin{table}%t5
\caption{Parameters from the second Monte Carlo simulation for~LMC.\label{tab5}}
 {\begin{tabular} {lll} \hline \hline\noalign{\smallskip}
For a scatter of 1&&\\
\hline
 Slope&         Mean&      Standard\\
  before&        slope&      deviation\\
 selection&     after &       of slope\\
 &        selection&  after selection\\
 \hline
   5.0000&   3.7876&    1.0019\\
   4.5000&   3.3537&    0.8958\\
   4.0000&   3.1155&    0.4671\\
   3.5000&   2.8753&    0.3201\\
   3.0000&   2.6225&    0.1920\\
   2.5000&   2.3306&    0.1533\\
   2.0000&   1.8482&    0.1170\\
   1.5000&   1.3903&    0.0778\\
   1.0000&   0.9298&    0.0350\\
\hline
For a scatter of 2&&\\
\hline
   5.0000&   3.1890&    1.1770\\
   4.5000&   2.9444&    0.8250\\
   4.0000&   2.8324&    0.9241\\
   3.5000&   2.5965&    0.4056\\
   3.0000&   2.3976&    0.3581\\
   2.5000&   2.0796&    0.2426\\
   2.0000&   1.6452&    0.2002\\
   1.5000&   1.2089&    0.1235\\
   1.0000&   0.8007&    0.0690\\
 \hline
\end{tabular}}
\end{table}