\begin{table}%t2
\caption{Results.}
\label{Table:results}
%\begin{center}
{
\begin{tabular}{lccccccc}
\hline
\hline
Name & Feature  & Flux (I) & $V_{\rm rad}$ & $\Delta
v_{\rm L}$ & $P_{V}$ &
$B~{\cos}~\theta$ LTE & $B~{\cos}~\theta$ non-LTE \\
 & & (Jy) & (km~s$^{-1}$) & (km~s$^{-1}$) & $(\times10^{-3})$ &
${\rm (mG)}$& ${\rm (mG)}$\\
\hline
VX Sgr & a & 18.8 & $-$2.01 & 0.47 & 21.0 & 350 $\pm$ 72 & 512 $\pm$ 90 \\  
 & b$^*$ & 11.7 & $-$1.28 & 0.38 & 22.6 & $-$307 $\pm$ 99 & $-$248 $\pm$ 62 \\
 & c & 6.9 & 7.18 & 0.61 & 171.2 & 3705 $\pm$ 249 & 3375 $\pm$ 265 \\
 & d & 23.1 & 7.16 & 0.52 & 32.5 & $-$609 $\pm$ 67 & $-$469 $\pm$ 60 \\
 & e & 18.9 & 6.81 & 0.53 & 19.2 & 359 $\pm$ 79 & 249 $\pm$ 46 \\
 & f & 36.7 & 16.43 & 0.57 & & & $<$54 \\  
 & g & 43.2 & 13.77 & 0.58 & 3.5 & $-$75 $\pm$ 34 & $-$63 $\pm$ 20 \\
 & h & 9.6 & 11.86 & 0.57 & 15.5 & $-$326 $\pm$ 184 & $-$290 $\pm$ 115 \\
 & i & 23.3 & 12.73 & 0.48 & & & $<$99 \\  
 & j & 9.4 & $-$0.9 & 0.62 & 16.4 & $-$370 $\pm$ 202 & $-$325 $\pm$ 126 \\
 & k & 6.3 & $-$0.7 & 0.56 & 14.4 & 285 $\pm$ 281 & 277 $\pm$ 195 \\
 & l & 14.9 & 6.73 & 0.51 & 66.7 & 1231 $\pm$ 123 & 966 $\pm$ 120 \\
 & m & 9.7 & 20.6 & 0.52 & 9.9 & $-$188 $\pm$ 140 & $-$167 $\pm$ 87 \\
 & n$^{**}$ & 14.5 & $-$0.1 & 0.87 & 162.7 & $-$4954 $\pm$ 238 & $-$4082 $\pm$ 305 \\
 & o & 6.8 & 21.19 & 0.71 & & & $<$381 \\ 
 & p & 6.3 & 22.17 & 0.62 & & & $<$471 \\
 & q & 8.5 & 20.97 & 0.49 & & & $<$239 \\
 & r & 3.4 & 20.93 & 0.62 & & & $<$687 \\
 & s & 2.7 & 9.95 & 0.54 & & & $<$987 \\
 & t & 8.4 & 16.26 & 0.48 & & & $<$217 \\
 & u & 9.9 & 13.64 & 0.58 & 4.5 & $-$94 $\pm$ 154 & $-$85 $\pm$ 99 \\
 & v & 7.2 & 7.1 & 0.51 & 39.9 & $-$738 $\pm$ 194 & $-$366 $\pm$ 75 \\
 & w$^{**}$ & 4.7 & 1.17 & 0.56 & 109.6 & 2160 $\pm$ 387 & 2195 $\pm$ 251 \\
 & x & 5.1 & 18.24 & 0.69 & & & $<$512 \\ 
 & y & 6.8 & 2.52 & 0.46 & 61.1 & 1012 $\pm$ 281 & 921 $\pm$ 208 \\
\hline
U Her & a & 9.75 & $-$14.56 & 0.55 & & & $<$127 \\
 & b & 3.75 & $-$14.42 & 0.58 & & & $<$418 \\
 & c & 2.09 & $-$15.82 & 0.55 & & & $<$610 \\
\hline
U Ori & a$^*$  & 6.44 & $-$41.05 & 0.61 & 22.6 & $-$517 $\pm$ 152 & $-$401 $\pm$ 96 \\
 & b & 1.87 & $-$41.23 & 0.75 & 217.9 & $-$5770 $\pm$ 718 & $-$3192 $\pm$ 425 \\
 & c & 0.95 & $-$40.85 & 0.66 & 140.4 &  3462 $\pm$ 1210 &  1398 $\pm$ 382 \\
\hline\\[-2mm]
\end{tabular}}
\parbox{13cm}{
$^*$ No accurate fit possible (see text). \\
$^{**}$ Suffer from interference (see text).}
%\end{center}
\par
\end{table}