\begin{table}%t2
\caption{Stellar parameters taken from \cite{Allende99}. The first column gives the name
of the planet followed by the stellar HD and HIP~numbers. The other columns
list the apparent visual magnitude, the parallax, the absolute magnitude, the
colour~$B-V$ and the stellar mass, radius, bolometric correction and effective
temperature. The rms errors are given below the parameter values except for
the radius. Note that \cite{Allende99} originally gave the radius as $\log
R$. Hence, the error stated below the calculated radius is the maximum
deviation of the calculated value obtained by applying the rms~error to the
$\log R$~value.}\label{tab:stars1}
%\centering
\par
\begin{tabular}{lcccccccc}
\hline\hline
Planet&$V{\rm mag}$& plx & $V{\rm MAG}$&$B-V$& Mass &$R_{\star}$&$BC$&$\log T_{\rm eff}$\\
&[mag]&[mas]&[mag]&[mag]&[$M_{\odot}$]&[$R_{\odot}$]&[mag]&[K]\\ 
\hline
OGLE-TR-56 b&&&&&&&&\\
HD 83443 b&8.23&22.97&5.04&0.811&0.98&1&0.13&3.74\\
\multicolumn{1}{r}{83443}&&0.9&0.17&&0.01&0.05&0.01&0\\
\multicolumn{1}{r}{47202}&&&&&&&&\\
HD 46375 b&7.91&29.93&5.29&0.86&0.9&1&0.16&3.73\\
\multicolumn{1}{r}{46375}&&1.07&0.16&&0.01&0.05&0.01&0\\
\multicolumn{1}{r}{31246}&&&&&&&&\\
HD 187123 b&7.83&20.87&4.43&0.661&1.12&1.15&0.04&3.77\\
\multicolumn{1}{r}{187123}&&0.71&0.15&&0.1&0.05&0.03&0.01\\
\multicolumn{1}{r}{97336}&&&&&&&&\\
HD 179949 b&6.25&36.97&4.09&0.548&1.14&1.17&0.03&3.79\\
\multicolumn{1}{r}{179949}&&0.8&0.1&&0.07&0.03&0.02&0\\
\multicolumn{1}{r}{94645}&&&&&&&&\\
HD 209458 b&7.65&21.24&4.29&0.594&1.03&1.15&0.06&3.78\\
\multicolumn{1}{r}{209458}&&1&0.21&&0.11&0.08&0.02&0.01\\
\multicolumn{1}{r}{108859}&&&&&&&&\\
HD 75289 b&6.35&34.55&4.04&0.578&1&1.32&0.07&3.78\\
\multicolumn{1}{r}{75289}&&0.56&0.07&&0.1&0.06&0.02&0.01\\
\multicolumn{1}{r}{43177}&&&&&&&&\\
BD-10\_3166 b&&&&&&&&\\
$\tau$ Boo b&4.5&64.12&3.53&0.508&1.3&1.41&$-$0.01&3.81\\
\multicolumn{1}{r}{120136}&&0.7&0.05&&0.12&0.07&0.03&0.01\\
\multicolumn{1}{r}{67275}&&&&&&&&\\
HD 76700 b&8.16&16.75&4.28&0.745&1&1.38&0.1&3.75\\
\multicolumn{1}{r}{76700}&&0.66&0.17&&0.09&0.1&0.03&0.01\\
\multicolumn{1}{r}{43686}&&&&&&&&\\
51 Peg b&5.45&65.1&4.52&0.666&1.01&1.15&0.08&3.76\\
\multicolumn{1}{r}{217014}&&0.76&0.05&&0.01&0.03&0&0\\
\multicolumn{1}{r}{113357}&&&&&&&&\\
HD 49674 b&8.1&24.55&5.05&0.729&0.95&0.95&0.11&3.75\\
\multicolumn{1}{r}{49674}&&1.14&0.2&&0.04&0.07&0&0\\
\multicolumn{1}{r}{32916}&&&&&&&&\\
$\upsilon$ And b&4.1&74.25&3.45&0.536&1.37&1.45&$-$0.03&3.81\\
\multicolumn{1}{r}{9826}&&0.72&0.05&&0.01&0.03&0&0\\
\multicolumn{1}{r}{7513}&&&&&&&&\\
 \hline
\end{tabular}
\end{table}