\begin{table}%t1
\caption{\label{t1}Ratio of the global magnetic to kinetic energy at minimum
         magnetic Reynolds number for a sequence of the Hall
         parameter $\beta$.}
         %\centering
\par
\begin{tabular}{c|llllll}
  \hline\hline
  $\beta$ & $-0.3$ & $-0.1$ & 0 & 0.1 & 0.33 & 1 \\
  $E_{\rm mag}/E_{\rm kin}$ & 0.77 & 1.20 & 1.52 & 1.94 & 3.32 & 11.4 \\
  \hline
\end{tabular}
\end{table}