\begin{table}%t1
\caption{Results of IR imaging for HD~34700.  } \label{photresults}
%\centerline
{
\begin{tabular}{lllllll}
  \hline
  \hline
   & Sep. [\arcsec] & PA [$^\circ$] & $J$ & $H$ & $K$ & Br$\gamma$$^a$ \\
  \hline
  A & --    & --    & --     & --     &7.7$^b$& 0.0\\
  B & 5.18 $\pm$ 0.01 & 69.1 $\pm$ 0.1 & 12.29$^c$ & 11.52$^c$ & 11.03$^c$ & 3.3\\
  C & 9.17 $\pm$ 0.01 & 54.9 $\pm$ 0.1 & 12.78$^c$ & 12.14$^c$ & 11.91$^c$ & 4.2\\
  \hline
\end{tabular}}
\medskip
$^{a}$ Instrumental magnitudes. \\
$^{b}$ Extrapolated from the relative Br$\gamma$~magnitudes of~A, B, and~C. Its error is 0.1$^{\rm m}$.  \\
$^{c}$ Errors in the photometry of components B and~C is 0.03$^{\rm m}$.
\end{table}