\begin{table}%t1
%\centering
\par
\caption{EGRET third catalogue sources observed by our array. $l_d$ and $b_d$ are displaced galactic coordinates,
  $\sigma_{E1}$, $\sigma_{E2}$ and $\sigma_{\rm tot}$ are  the statistical
  significances
related to the first experiment, the second experiment and the sum
of the two, $r_{\rm e}$ is the error angular radius, $\bar{z}$ is the
mean value of zenith angles of EASs for source and
  "Flux'' is the number of EAS events for source. $t1$: AGN which has been
  investigated before by CASA-MIA (\cite{catanese}), $t2$: sources with energy $>$1~GeV
(\cite{lamb}). Sources number~5 and~7 are "Mrk 421'' and "4C +10.45''
respectively.\label{tab1}}
  \begin{tabular}{ccccccccccccccc}
\hline\hline
    &Name&$l$&$b$&ID&$l_d$&$b_d$&$\sigma_{E1}$&$\sigma_{E2}$&$\sigma_{\rm tot}$&$r_{\rm e}(^\circ)$&$\bar{z}$&Flux&$t1$&$t2$\\
    \hline
    1 &3EG J0237+1635 & 156.46 & --39.28 &A& 157 & --39 & 1.29 & 2.80 & 2.90 & 4.70 & 24.87 & 630 &$\surd$&$\surd$\\
    2 &3EG J0407+1710 & 175.63 & --25.06 & & 175 & --24 & 1.65 & 1.28 & 1.95 & 4.78 & 24.05 & 782 &       &\\
    3 &3EG J0426+1333 & 181.98 & --23.82 & & 182 & --23 & 1.11 & 2.60 & 2.79 & 4.89 & 26.97 & 702 &       &\\
    4 &3EG J0808+5114 & 167.51 & 32.66  &a& 168 & 33  & 1.40 & 1.37 & 1.91 & 5.10 & 23.29 & 1241&       &\\
    5 &3EG J1104+3809 & 179.97 & 65.04  &A& 180 & 66  & 1.17 & 1.30 & 1.73 & 4.43 & 15.97 & 485 &$\surd$&$\surd$\\
    6 &3EG J1308+8744 & 122.74 & 29.38  & & 124 & 28  & 2.43 & 1.88 & 3.43 & 4.76 & 44.14 & 412 &       &\\
    7 &3EG J1608+1055 & 23.51  & 41.05  &A& 23  & 42  & 1.53 & 1.55 & 2.11 & 4.62 & 29.27 & 431 &$\surd$&\\
    8 &3EG J1824+3441 & 62.49  & 20.14  & & 61  &21   & 1.05 & 1.60 & 1.91 & 4.74 & 16.19 & 1370&       &\\
    9 &3EG J2036+1132 & 56.12  & --17.18 &A& 57  & --18 & 1.09 & 1.62 & 1.95 & 5.16 & 28.05 & 851 &       &\\
    10&3EG J2209+2401 & 81.83  & --25.65 &A& 81  & --27 & 1.45 & 1.60 & 1.86 & 4.25 & 21.40 & 844 &$\surd$&\\
    \hline
  \end{tabular}
  \end{table}