\begin{table}%TA.2
%\centering
\par
  \caption{Line strengths of fully corrected (see Sect.~\ref{obs})
    Lick indices of the FORS Deep Field galaxies
    together with their errors and (by-eye) quality flags. Units are \AA.
    Quality flags: 0: satisfactory, 1: a bit noisy, 2: in region of strong sky
    line, 6: affected by telluric $B$ band, 7: affected by telluric $A$ band,
    8: affected by end of spectrum, 9: not visible.
  }
  \label{lick}
  \begin{tabular}{ccccccccccccc}
  \hline\hline
  \noalign{\smallskip}
 FDF & \hdf & d\hdf & q\hdf & \hgf & d\hgf & q\hgf & \hb & d\hb & q\hb & \mgb & d\mgb & q\mgb \\
  \noalign{\smallskip}
  \hline
  \noalign{\smallskip}
1161 & 1.3 & 0.2 & 0 & --0.6 & 0.2 & 0 & 1.6 & 0.2 & 0 & 2.7 & 0.3 & 1  \\ 
4285 & 1.2 & 0.2 & 0 & --0.7 & 0.2 & 0 & 1.5 & 0.2 & 0 & 3.3 & 0.2 & 0  \\ 
5011 & 1.0 & 0.2 & 0 &  0.4 & 0.2 & 0 & 1.9 & 0.3 & 1 &  *  &  *  & 9  \\ 
5908 &  *  &  *  & 9 &   *  &  *  & 9 & 1.8 & 0.1 & 0 & 4.5 & 0.1 & 0  \\ 
6307 & 0.8 & 0.2 & 2 & --0.8 & 0.3 & 2 & 1.9 & 0.2 & 0 & 3.7 & 0.3 & 0  \\ 
6336 & 2.6 & 0.3 & 0 & --0.7 & 0.3 & 2 & 0.5 & 0.3 & 2 &  *  &  *  & 7  \\ 
6338 &  *  &  *  & 9 &   *  &  *  & 8 &  *  &  *  & 6 & 3.7 & 0.2 & 0  \\ 
6439 &  *  &  *  & 9 &   *  &  *  & 8 & 2.5 & 0.3 & 0 & 3.1 & 0.4 & 0  \\ 
7116 &  *  &  *  & 9 & --0.4 & 0.2 & 2 & 2.3 & 0.2 & 0 & 3.9 & 0.3 & 1  \\ 
7459 & 2.5 & 0.2 & 2 & --0.1 & 0.2 & 0 & 2.4 & 0.2 & 0 & 3.2 & 0.4 & 1  \\ 
7796 & 2.0 & 0.2 & 0 &  1.0 & 0.2 & 0 &  *  &  *  & 6 & 3.8 & 0.3 & 0  \\ 
8372 &  *  &  *  & 9 &   *  &  *  & 8 & 1.8 & 0.3 & 0 & 4.2 & 0.4 & 2  \\ 
8626 &  *  &  *  & 9 &   *  &  *  & 8 &  *  &  *  & 6 & 5.3 & 0.2 & 0  \\ 
  \noalign{\smallskip}
  \hline 
  \end{tabular}
\end{table}